XIL Error Messages B

This appendix contains a listing of the err or messages that can be generated by the XIL library . Breaks in the sequential numbering of the err ors do not indicate missing err ors. These ar e mer ely gaps that occurr ed as the numbers were assigned.

B TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

di -1 Out Of Memory All functions

di-2 Image sour ce1 bands or type does not match destination xil_extrema(), xil_fill(),
xil_add(), xil_add_const(),
xil_and(), xil_and_const(),
xil_threshold(),
xil_black_generation(),
xil_convolve(), xil_copy(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(), xil_histogram(),
xil_multiply(),
xil_multiply_const(),
xil_not(), xil_or(),
xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_set_value(),
xil_soft_fill(),
xil_squeeze_range(),
xil_subsample_adaptive(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_transpose(), xil_xor(),
xil_cis_get_output_type(),
xil_decompress(), xil_absolute() ,

xil_edge_detection(), xil_max(), xil_min(), xil_tablewarp(), xil_tablewarp_horizontal(), xil_tablewarp_vertical()

B

di-3 Image sour ce 2 does not match destination xil_extrema(), xil_fill(),
xil_add(), xil_add_const(),
xil_and(), xil_and_const(),
xil_threshold(),
xil_black_generation(),
xil_convolve(), xil_copy(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(), xil_histogram(),
xil_multiply(),
xil_multiply_const(),
xil_not(), xil_or(),
xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_set_value(),
xil_soft_fill(),
xil_squeeze_range(),
xil_subsample_adaptive(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_transpose(), xil_xor(),
xil_cis_get_output_type(),
xil_decompress(), xil_absolute(),

xil_edge_detection(), xil_max(), xil_min(), xil_tablewarp(), xil_tablewarp_horizontal(), xil_tablewarp_vertical(),

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-4 Image sour ce 3 does not match destination xil_extrema(), xil_fill(),
xil_add(), xil_add_const(),
xil_and(), xil_and_const(),
xil_threshold(),
xil_black_generation(),
xil_convolve(), xil_copy(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(), xil_histogram(),
xil_multiply(),
xil_multiply_const(),
xil_not(), xil_or(),
xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_set_value(),
xil_soft_fill(),
xil_squeeze_range(),
xil_subsample_adaptive(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_transpose(), xil_xor(),
xil_cis_get_output_type(),
xil_decompress()

di-5 Operation not implemented All functions

di-6 Could not get ROI of an image

Asecondary err or caused by an internal error. Could occur with any function.

di-7 Could not intersect ROIs Asecondary err or caused by an internal error. Could occur with any function.

di-8 Could not get r egion list from ROI

Asecondary err or caused by an internal error. Could occur with any function.

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-9 Could not get sr c1 as memory xil_add(), xil_add_const(),
xil_affine(), xil_and(),
xil_and_const(),
xil_black_generation(),
xil_blend(), xil_cast(),
xil_convolve(), xil_copy(),
xil_copy_pattern(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(),
xil_error_diffusion(),
xil_extrema(), xil_fill(),
xil_rotate(), xil_scale(),
xil_translate(),
xil_transpose(),
xil_histogram(), xil_lookup(),
xil_multiply(),
xil_multiply_const()
xil_nearest_color(), ,
xil_not(), xil_or(),
xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_soft_fill(),
xil_subsample_adaptive(),
xil_subsample_binary_to_gray(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_threshold(), xil_xor(),
xil_edge_detection(),
xil_tablewarp(),
xil_tablewarp_horizontal(),
xil_tablewarp_vertical()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-10 Couldn�t get dst1 as memory xil_add(), xil_add_const(),

xil_affine(), xil_and(),
xil_and_const(),
xil_black_generation(),
xil_blend(), xil_cast(),
xil_choose_colormap(),
xil_color_convert(),
xil_convolve(), xil_copy(),
xil_copy_pattern(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(),
xil_error_diffusion(),
xil_extrema(), xil_fill(),
xil_rotate(), xil_scale(),
xil_translate(),
xil_transpose(), xil_lookup(),
xil_multiply(),
xil_multiply_const(),
xil_nearest_color(), xil_not(),
xil_or(), xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_soft_fill(),
xil_subsample_adaptive(),
xil_subsample_binary_to_gray(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_threshold(), xil_xor(),
xil_absolute(),
xil_copy_with_planemask(),
xil_max(), xil_min(),
xil_tablewarp(),
xil_tablewarp_horizontal(),
xil_tablewarp_vertical()

di-11 Could not get alpha as memory xil_blend()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-12 Could not get combined ROI xil_add(),

xil_add_const(),xil_and(),
xil_and_const(),
xil_black_generation(),
xil_blend(), xil_cast(),
xil_color_convert(), xil_copy(),
xil_dilate(), xil_divide(),
xil_divide_by_const(),
xil_divide_into_const(),
xil_erode(),
xil_error_diffusion(),
xil_lookup(), xil_multiply(),
xil_multiply_const(),
xil_nearest_color(), xil_not(),
xil_or(), xil_or_const(),
xil_ordered_dither(),
xil_paint(), xil_rescale(),
xil_subtract(),
xil_subtract_const(),
xil_subtract_from_const(),
xil_threshold(), xil_xor(),

xil_absolute(), xil_copy_with_planemask(), xil_max(), xil_min()

di-13 Dependent count over�ow xil_compress(), xil_decompress()

di-14 Could not copy ROI A secondary err or caused by memory resour ce limitations. Could occur with any function.

di-15 Could not get sr c2 as memory

A secondary err or caused by an internal error. Could occur with any function.

di-16 ROI translation failed xil_copy_pattern(). Secondary err or probably due to r esour ce problems.

di-17 Attempted to get an unknown attribute xil_cis_get_attribute()

di-18 Attempted to get a set-only attribute xil_cis_get_attribute()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-19 Attempted to set an unknown attribute xil_cis_set_attribute()

di-20 Attempted to set a get-only attribute xil_cis_set_attribute()

di-21 Cannot cr eate op A secondary err or pr obably due to resour ce problems. Could occur with any function.

di-22 Image type mismatch Any function

di-23 Unable to perform the speci�ed function

Should not happen unless an err or occurr ed during the operation

di-24 Could not get the ROI list xil_transpose()

di-55 XilCis: JPEG attribute err or: cannot have interleaved bands with dif ferent selector(s) and/or pt_transform values

Reported by the JPEG lossless compr essor

di-56 XilCis: JPEG attribute err or: DECOMPRESSION_ QUALITY value must be >= 1 and <= 100 xil_cis_set_attribute()

di-57 XilCis: JPEG attribute err or: ENCODE_INTERLEA VED value must be either TRUE or FALSE xil_cis_set_attribute()

di-58 XilCis: JPEG attribute err or: ENCODE_VIDEO value must be either TRUE or FALSE xil_cis_set_attribute()

di-59 XilCis: JPEG attribute err or: COMPRESSION_QUALITY value must be >=1 and <=100 xil_cis_set_attribute()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-60 XilCis: JPEG attribute err or: TEMPORAL_FILTER value must be either TRUE or FALSE xil_cis_set_attribute()

di-61 XilCis: JPEG attribute err or: OPTIMIZE_HUFFMAN_ TABLES value must be either TRUE or FALSE xil_cis_set_attribute()

di-62 XilCis: JPEG attribute err or: COMPRESSED_DA TA_ FORMAT value must be either INTERCHANGE or ABBREVIATED_FORMAT xil_cis_set_attribute()

di-63 XilCis: Cell attribute err or: Must set DECOMPRESSOR_ COLORMAP befor e RDWR_INDICES xil_cis_set_attribute() (for Cell)

di-64 XilCis: Cell attribute err or: RDWR_INDICES: Invalid NULL index list xil_cis_set_attribute() (for Cell)

di-65 XilCis: Cell attribute err or: RDWR_INDICES: Invalid index list count xil_cis_set_attribute() (for Cell)

di-66 XilCis: ROIs not allowed for compr ess image

Reported by JPEG lossless compr essor

di-67 XilCis: JPEG bytestr eam error: Invalid code value index xil_decompress(). This err or can also

be generated by xil_cis_has_frame(),

xil_cis_number_of_frames(), and
xil_cis_seek() if user inserts data into

the CIS with

xil_cis_put_bits_[ptr]() with an

unknown or partial number of frames.

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-68 XilCis: JPEG bytestr eam error: Invalid symbol table ID xil_decompress(). This err or can also

be generated by xil_cis_has_frame(),

xil_cis_number_of_frames(), and
xil_cis_seek() if user inserts data into

the CIS with

xil_cis_put_bits_[ptr]() with an

unknown or partial number of frames.

di-69 XilCis: JPEG bytestr eam error: Invalid Huf fman code length xil_decompress(). This err or can also

be generated by xil_cis_has_frame(),

xil_cis_number_of_frames(), and
xil_cis_seek() if user inserts data into

the CIS with

xil_cis_put_bits_[ptr]() with an

unknown or partial number of frames.

di-70 XilCis: JPEG bitstr eam err or: Invalid value for pr ediction selector xil_cis_set_attribute()

di-71 XilCis: JPEG bitstr eam err or: Invalid value for point transform xil_cis_set_attribute()

di-72 XilCis: JPEG bitstr eam err or: Invalid SOF marker for this decompr essor xil_decompress()

di-73 XilCis: JPEG bitstr eam err or: Invalid selector in SOF segment xil_decompress()

di-74 XilCis: JPEG bitstr eam err or: Unsupported image precision in SOF segment xil_decompress()

di-75 XilCis: JPEG bitstr eam err or: Invalid image height in SOF segment xil_decompress()

di-76 XilCis: JPEG bitstr eam err or: Invalid image width in SOF segment xil_decompress()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-77 XilCis: JPEG bitstr eam err or: Invalid qtable marker 0 xil_compress()

di-78 XilCis: JPEG bitstr eam err or: Table not used by any bands xil_compress()

di-79 XilCis: JPEG bitstr eam err or: Invalid quantizer pr ecision identi�er xil_cis_create(), xil_compress(),
xil_decompress()

di-80 XilCis: JPEG bitstr eam err or: Number of quantizer tables too lar ge xil_cis_create()

di-81 XilCis: JPEG bitstr eam err or: Table identi�er not in use xil_decompress()

di-82 XilCis: JPEG bitstr eam err or: Invalid table identi�er xil_decompress()

di-83 XilCis: JPEG bitstr eam err or: Invalid ac table identi�er xil_decompress()

di-84 XilCis: JPEG bitstr eam err or: dc table identi�er not in use xil_compress()

di-85 XilCis: JPEG bitstr eam err or: Invalid dc table identi�er xil_compress()

di-86 XilCis: JPEG bitstr eam err or: Invalid component identi�er xil_decompress()

di-87 XilCis: JPEG bitstr eam err or: attempted use of non loaded ac table xil_decompress()

di-88 XilCis: JPEG bitstr eam err or: attempted use of non loaded dc table xil_compress()

di-89 XilCis: JPEG bitstr eam err or: attempted use of non loaded qtable xil_compress()

di-90 XilCis: JPEG bitstr eam err or: invalid htable identi�er xil_decompress()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-91 XilCis: JPEG bitstr eam err or: invalid qtable identi�er xil_cis_create(), xil_compress()

di-92 XilCis: JPEG bitstr eam err or: unknown htable type xil_cis_set_attribute()

di-93 XilCis: JPEG bitstr eam err or: invalid band number xil_cis_get_attribute()

di-94 XilCis: JPEG bitstr eam err or: table index too lar ge xil_decompress()

di-95 XilCis: internal err or xil_cis_create(),

xil_cis_get_output_type(),
xil_cis_get_attribute(),
xil_compress(), xil_decompress(),
xil_cis_has_data(),
xil_nearest_color(),
xil_cis_destroy()

di-96 XilCis: Wrong number of ops in molecule xil_nearest_color()

di-97 XilCis: Cell bitstr eam err or xil_nearest_color()

di-98 XilCis: JPEG bitstr eam err or xil_decompress()

di-100 XilCis: No data to decompr ess xil_cis_get_output_type()

di-101 XilCis: Could not cr eate CIS destination image xil_decompress(). Secondary err or

that occurs when the compr essor is unable to allocate a temporary image to compr ess into.

di-102 XilCis: JPEG cannot encode image as 4:1:1 yuv , using ENCODE_INTERLEA VED attribute instead xil_compress()

di-103 XilCis: JPEG cannot interleave image, it has 5 or more bands xil_compress()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-104 XilCis: Wrote mor e than maximum frame size into buffer space xil_compress(). Internal err or. This

should never happen.

di-105 XilCis: Seek to frame number not in CIS xil_cis_seek()

di-106 XilCis: Desir ed frame number no longer in CIS xil_cis_seek()

di-107 XilCis: CIS is empty , cannot seek to frame number xil_cis_seek()

di-108 XilCis: No pr evious desir ed frame type to seek backwar d to xil_cis_seek(). Internal err or.

di-109 XilCis: Unable to complete seek by skipping (burning) frames xil_nearest_color()

di-110 XilCis: Complete frame does not exist. No data to decompr ess xil_decompress()

di-111 XilCis: Image width and height must be a multiple of 4 xil_cis_get_attribute(),
xil_decompress(),
xil_cis_get_output_type(),
xil_cis_has_data()

di-112 XilCis: Could not cr eate XilLookup for colormap xil_decompress() (for Cell)

di-113 XilCis: Fax: sour ce not a bit image xil_compress()

di-114 XilCis: Incomplete frame in buffer, cannot copy until complete xil_compress(),
xil_cis_put_bits()

di-115 Xilcis: start_frame adjusted past r ead_frame. CIS data lost.

xil_cis_seek(), xil_compress()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-116 XilCis: unsupported or illegal pr ecision for compr essed image xil_decompress(). Internal err or.

di-117 XilCis: Invalid NULL CIS speci�ed xil_cis*() (ny xil_cis* routine)

di-118 XilCis: Partial frame end adjustment err or on frame position xil_compress(),
xil_cis_put_bits()

di-119 XilCis: Partial frame end adjustment err or on frame list xil_compress(),
xil_cis_put_bits()

di-120 XilCis: Cannot cr eate copy op xil_compress(), xil_decompress()

di-121 XilCis: Invalid compr ession type or speci�cation xil_compress(), xil_decompress()

di-122 XilCis: Can�t create compr ession op xil_decompress()

di-123 XilCis: Decompr ess destination image�s type or nbands does not match CIS xil_decompress()

di-124 XilCis: Illegal r elative_to value in xil_cis_seek() xil_cis_seek()

di-125 XilCis: Compr ession device is unavailable xil_cis_create()

di-126 XilCis: Couldn�t cr eate compr ession device xil_cis_create()

di-127 Lookup would be too lar ge for data type xil_lookup_create(),
xil_colorcube_create()

di-128 Colorcube multipliers do not match sizes xil_colorcube_create()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-129 Object would be too lar ge for 32-bit addr essability xil_create(),
xil_create_from_type(),
xil_kernel_create(),
xil_dithermask_create(),
xil_sel_create(),
xil_lookup_create(),
xil_colorcube_create(),
xil_histogram_create()

di-130 Attempted to r ead or write outside the range of a lookup xil_lookup_get_values(),
xil_lookup_set_values()

di-131 Invalid NULL lookup xil_ordered_dither(),

xil_error_diffusion(),
xil_nearest_color(),
xil_lookup_convert(),
xil_choose_colormap(),
xil_lookup(),
xil_lookup_destroy(),
xil_lookup_get_input_datatype(),
xil_lookup_get_output_datatype(),
xil_lookup_get_output_nbands(),
xil_lookup_get_num_entries(),
xil_lookup_get_version(),
xil_lookup_get_offset(),
xil_lookup_set_offset(),
xil_lookup_get_colorcube(),
xil_lookup_get_colorcube_info(),
xil_lookup_get_values(),
xil_lookup_set_values(),
xil_lookup_create_copy()

di-132 Look-up type mismatch xil_lookup_convert()

di-133 Lookup may not have input type of XIL_FLOA T xil_lookup_create(),
xil_colorcube_create()

di-134 Incorr ect data type for image xil_create()

di-135 Attempted to set attribute on a non-device image xil_set_device_attribute()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-136 Attempted to get attribute of a non-device image xil_get_device_attribute()

di-137 Requested pixel outside range of image xil_set_pixel(), xil_get_pixel()

di-138 Could not get image as memory xil_get_memory_storage()

di-139 Could not pr opagate image storage xil_get_memory_storage(),
xil_set_memory_storage().

This is pr obably the r esult of another err or, such as r unning out of memory .

di-140 Could not get image storage Internal system err or

di-141 Could not cr eate storage device xil_get_pixel(), xil_set_pixel(),
xil_get_memory_storage()

di-142 Cannot get memory storage on non-exported image xil_get_memory_storage()

di-143 Could not access storage device

Internal system err or

di-144 Could not copy colormap xil_ordered_dither()

di-145 Could not cr eate ROI A secondary err or caused by an internal error. Could occur with any function.

di-146 Invalid parameters passed to function xil_add(), xil_create(),
xil_create_child(),
xil_create_copy(),
xil_set_origin(),
xil_histogram_create(),
xil_kernel_create(),
xil_lookup_create(),
xil_sel_create()

di-147 Could not cr eate image Secondary err or in xil_create(),

xil_create_child(),
xil_create_copy()

di-148 Child count exceeded on parent — could not cr eate child image xil_create_child()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-149 Could not cr eate input/output device

Internal system err or

di-150 Could not access input/output device

Internal system err or

di-151 Image alr eady exported xil_export()

di-152 Image is of a type that cannot be exported xil_export()

di-153 Cannot import image that was not pr eviously exported xil_import()

di-154 Image must be exported to set memory storage xil_set_memory_storage()

di-155 Cannot set memory storage on a child image xil_set_memory_storage()

di-156 Image band mismatch xil_cast(), xil_copy(),

xil_affine(), xil_blend(),
xil_copy_pattern(), xil_rotate(),
xil_scale(),
xil_subsample_binary_to_gray(),
xil_translate(),
xil_absolute(),
xil_edge_detection(),
xil_max(), xil_min()

di-157 Unde�ned image data type encounter ed

Internal err or

di-158 Could not load .so �le xil_open(),

xil_create_from_device()

di-159 Could not extract symbols from .so �le xil_open()

di-160 Could not expand $XILHOME path xil_open()

di-161 Could not open $XILHOME/lib/ xil.compute �le xil_open()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-162 XIL Xlib I/O Driver: could not get graphics context xil_create_from_window()

di-163 Could not copy kernel xil_convolve(),

xil_kernel_create(),
xil_error_diffusion()

di-164 Input and output must be in CMYK color space xil_black_generation()

di-165 Alpha channel image must have only 1 band xil_blend()

di-166 Invalid size for lookup xil_choose_colormap(),

xil_lookup_create(),
xil_error_diffusion(),
xil_nearest_color()

di-167 Image must have 3 bands xil_choose_colormap()

di-169 SEL must be speci�ed xil_dilate(), xil_erode()

di-170 Could not copy SEL xil_dilate(), xil_erode(),

xil_sel_create_copy()

di-171 Coef�cient(s) would cause a divide by zer o xil_divide()

di-172 Supplied coef �cient(s) contained NaN xil_divide(), xil_multiply(),
xil_subtract()

di-173 Number of bands in sr c image does not match lookup table xil_error_diffusion(),
xil_nearest_color(),
xil_ordered_dither()

di-174 Data type of dest image does not match look-up table input type xil_error_diffusion(),
xil_nearest_color()

di-175 Data type of sr c image does not match look-up table output type xil_error_diffusion(),
xil_nearest_color(),
xil_ordered_dither()

di-176 Output image must be single banded xil_error_diffusion(),
xil_nearest_color(),
xil_ordered_dither()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-177 Could not copy lookup xil_error_diffusion(),

xil_nearest_color(),
xil_lookup_create_copy()

di-179 Data type of sr c image does not match look-up table input type xil_lookup()

di-180 Data type of dest image does not match look-up table output type xil_lookup()

di-181 Input image must be single banded xil_lookup()

di-182 Brush must be speci�ed xil_paint()

di-183 Could not copy br ush xil_paint()

di-184 XilCis: Error AdjustStart Internal err or

di-185 Attempt to insert at illegal position in linked list

Internal err or

di-186 Attempt to delete at illegal position in linked list

Internal err or

di-187 NULL ROI passed to intersect r outine xil_roi_intersect()

di-188 Could not cr eate imagetype xil_cis_get_output_type(),

xil_cis_get_input_type(),
xil_create(),
xil_create_child(),
xil_create_copy(),
xil_create_from_device(),
xil_create_from_type(),
xil_create_from_window()

di-189 Could not cr eate kernel xil_kernel_create()

di-190 Could not cr eate dithermask xil_dithermask_create()

di-191 Could not cr eate SEL xil_sel_create()

di-192 Could not cr eate lookup xil_lookup_create()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-193 Could not branch to op Internal err or

di-194 No captur e operation de�ned for this device xil_copy()

di-195 No display operation de�ned for this device xil_copy()

di-197 Internal err or in getting op parameters

Internal err or

di-198 Internal err or in setting op parameters

Internal err or

di-199 Internal err or sear ching for optimized execution path

Internal err or

di-202 Source color space not speci�ed xil_color_convert()

di-203 Destination color space not speci�ed xil_color_convert()

di-204 Unsupported color conversion xil_color_convert()

di-205 Could not get color cube information

Internal err or

di-206 Lookup must be a color cube xil_ordered_dither()

di-207 Invalid NULL image speci�ed

All functions

di-208 Tried to r emove an err or handler which was not installed xil_remove_error_handler()

di-209 Cannot get system state fr om image

Internal err or

di-210 Cannot cr eate lookup for returning data xil_squeeze_range()

di-211 Cannot squeeze range of multiband image xil_squeeze_range()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-212 XIL I/O Driver: could not open speci�ed frame buf fer xil_create_from_device()

di-213 XIL I/O Driver: could not perform ioctl on frame buf fer xil_create_from_device()

di-214 XIL I/O Driver: frame buf fer not of expected type xil_create_from_device()

di-215 XIL I/O Driver: could not mmap device xil_create_from_device()

di-216 Could not get FLOA T image as memory

Internal err or

di-217 XIL Memory Driver: Could not get named storage type

A secondary err or that can be seen after any call that cr eates or copies images or CISs

di-218 XIL Memory Driver: Could not cr eate named storage device

A secondary err or that can be seen after any call that cr eates or copies images or CISs

di-219 XIL I/O Driver: could not connect to dga xil_create_from_device()

di-220 XIL I/O Driver: could not get window geometry xil_create_from_device()

di-221 Invalid NULL kernel speci�ed xil_convolve(),
xil_error_diffusion(),
xil_kernel_get_width(),
xil_kernel_get_height(),
xil_kernel_get_key_x(),
xil_kernel_get_key_y(),
xil_kernel_create_copy()

di-222 Invalid NULL dither mask speci�ed xil_dithermask_get_width(),
xil_dithermask_get_height(),
xil_dithermask_get_nbands(),
xil_dithermask_create_copy(),
xil_error_diffusion(),
xil_ordered_dither()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-223 Tried to write to an invalid CIS xil_compress()

di-224 Tried to r ead fr om an invalid CIS xil_decompress()

di-230 XilCis: Cell attribute failed because too few bytes per frame gr oup xil_cis_set_attribute()

(BITS_PER_SECOND)

di-231 XilCis: Cell key frame interval is too lar ge for bit rate contr ol xil_cis_set_attribute()

(KEYFRAME_INTERVAL)

di-232 XilCis: Cell key frame interval exceeds maximum xil_cis_set_attribute()

(KEYFRAME_INTERVAL)

di-233 Must specify histogram xil_histogram()

di-234 Number of bands in image and histogram do not match xil_histogram()

di-235 Zero bins in histogram not allowed xil_create_histogram()

di-236 Cannot cr eate histogram xil_create_histogram()

di-237 Could not initialize compr ession type xil_cis_create()

di-238 Could not initialize input/output type xil_create_from_device()

di-239 Could not set image attribute xil_set_attribute(). A secondary

error.

di-240 Error opening or parsing $XILHOME/lib/ xil.modules xil_open()

di-241 Error loading Xlib display driver xil_create_from_window()

di-242 Couldn�t cr eate display image xil_create_from_window(). A

secondary err or.

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-243 Number of bands cannot be 0 xil_lookup_create()

di-244 Cannot cr eate system state xil_open(). A secondary err or.

di-245 Invalid dither mask dimensions xil_dithermask_create()

di-246 Cannot cr eate global state xil_open(). A secondary err or.

di-247 Cannot initialize localization information xil_open()

di-248 Unable to load any compute device handlers xil_open(). Probably a secondary err or

due to impr oper con�guration.

di-249 XIL Xlib I/O Driver: could not get window attributes xil_create_from_window()

di-250 XIL Xlib I/O Driver: could not cr eate ximage xil_create_from_window()

di-251 Number of bands in sr c image does not match dither mask xil_ordered_dither()

di-252 Invalid color cube dimensions xil_colorcube_create()

di-253 XilCis: Cell compr ess image width is not an even multiple of 4 xil_compress()

di-254 XilCis: Cell compr ess image height is not an even multiple of 4 xil_compress()

di-255 Could not copy image xil_create_copy()

di-256 Could not install err or handler xil_install_error_handler()

di_257 Invalid NULL ROI speci�ed Any of the xil_roi*() functions

di-258 Seed pixel not within �ll region de�ned by �ll color xil_soft_fill()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-259 Invalid NULL data pointer xil_dithermask_create(),

xil_histogram_create(),
xil_kernel_create(),
xil_lookup_get_values(),
xil_lookup_set_values(),
xil_sel_create(),
xil_device_create(),
xil_interpolation_table_create()

di-260 Invalid NULL system state xil_create(),

xil_create_from_type(),
xil_create_from_device(),
xil_create_from_window(),
xil_cis_create(),
xil_roi_create(),
xil_kernel_create(),
xil_dithermask_create(),
xil_sel_create(),
xil_lookup_create(),
xil_colorcube_create(),
xil_histogram_create(),
xil_close(),
xil_state_get_synchronize(),
xil_state_set_synchronize(),
xil_state_get_show_action(),
xil_state_set_show_action(),
xil_install_error_handler(),
xil_remove_error_handler(),
xil_image_get_by_name(),
xil_lookup_get_by_name(),
xil_imageytpe_get_by_name(),
xil_cis_get_by_name(),
xil_dithermask_get_by_name(),
xil_kernel_get_by_name(),
xil_sel_get_by_name(),
xil_roi_get_by_name(),
xil_histogram_get_by_name(),
xil_colorspace_get_by_name()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-261 XilCis: Attempted to set Cell encoding type to unknown value xil_cis_set_attribute()

(�CELL_ENCODING_TYPE�)

di-262 Invalid NULL SEL speci�ed xil_sel_get_width(),

xil_sel_get_height(),
xil_sel_get_key_x(),
xil_sel_get_key_y,
xil_sel_cretae_copy()

di-263 Invalid kernel value (NaN) xil_kernel_create()

di-264 Invalid kernel value (in�nity or -in�nity) xil_kernel_create()

di-265 Invalid NULL histogram speci�ed xil_histogram_get_values(),
xil_histogram_get_limits(),
xil_histogram_get_info(),
xil_histogram_get_nbins(),
xil_histogram_get_nbands(),
xil_histogram_destroy()

di-266 Invalid image dimensions speci�ed xil_create(),
xil_create_from_type()

di-267 Could not copy dither mask xil_ordered_dither(),

xil_dithermask_create_copy()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-268 Invalid NULL object pointer xil_lookup_get_version(),

xil_object_get_type(),
xil_cis_get_name(),
xil_cis_set_name(),
xil_dithermask_get_name(),
xil_dithermask_set_name(),
xil_get_name(), xil_set_name(),
xil_histogram_get_name(),
xil_histogram_set_name(),
xil_imagetype_get_name(),
xil_imagetype_set_name(),
xil_kernel_get_name(),
xil_kernel_set_name(),
xil_lookup_get_name(),
xil_lookup_set_name(),
xil_roi_get_name(),
xil_roi_set_name(),
xil_sel_get_name(),
xil_sel_set_name()

di-269 Could not set image ROI Internal err or

di-271 Invalid dither mask value (NaN) xil_dithermask_create()

di-272 Invalid dither mask value (greater than 1.0 or less than 0.0) xil_dithermask_create()

di-273 Invalid SEL value (must be 0 or 1) xil_sel_create()

di-274 Could not cr eate internal symbol table xil_cis_create()

di-275 Could not cr eate internal Cell compr essor object xil_cis_create()

di-276 Internal err or op number not found

Internal err or

di-277 Could not cr eate internal CisBufferManager object xil_cis_create()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-278 Could not cr eate internal base XilDeviceCompr ession object xil_cis_create()

di-279 Could not set object name xil_cis_set_name(),

xil_dithermask_set_name(),
xil_set_name(),
xil_histogram_set_name(),
xil_imagetype_set_name(),
xil_kernel_set_name(),
xil_lookup_set_name(),
xil_roi_set_name(),
xil_sel_set_name(). A secondary

error.

di-280 Could not cr eate JpegLL compr essor object xil_cis_create()

di-281 Could not cr eate JpegLL decompr essor object xil_cis_create()

di-282 Could not cr eate XilCis xil_cis_create()

di-283 XilCis: Cell user data size is too lar ge xil_cis_set_attribute()

(�CELL_USER_DATA�)

di-284 XilCis: bitstr eam err or: Invalid SOF marker xil_decompress(),
xil_cis_number_of_frames(),
xil_cis_get_attribute(),
xil_cis_set_attribute(),
xil_cis_get_input_type(),
xil_cis_get_output_type(),
xil_cis_attempt_recovery(),
xil_cis_get_bits_ptr()

di-285 XilCis: Invalid bitstr eam parameters xil_decompress(),
xil_cis_number_of_frames(),
xil_cis_get_attribute(),
xil_cis_set_attribute(),
xil_cis_get_input_type(),
xil_cis_get_output_type(),
xil_cis_attempt_recovery(),
xil_cis_get_bits_ptr()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-286 Could not cr eate full set of standar d objects xil_open(); a secondary err or

di-287 Insert of operation failed xil_error_diffusion(),

xil_nearest_color(),
xil_ordered_dither(),
xil_squeeze_range(). A secondary

error.

di-288 XilCis: image for compr ess has ROIs or non-zer o origin xil_compress()

di-289 Invalid data in kernel for use with err or dif fusion xil_error_diffusion()

di-290 Partial frame start adjustment err or on frame position xil_decompress() (with partial frame in

the CIS),

xil_cis_number_of_frames(),
xil_cis_get_attribute(),
xil_cis_set_attribute(),
xil_cis_get_input_type(),
xil_cis_get_output_type(),
xil_cis_attempt_recovery(),
xil_cis_get_bits_ptr()

di-291 Partial frame �ag not set on buffer with partial frame xil_decompress(),
xil_cis_number_of_frames(),
xil_cis_get_attribute(),
xil_cis_set_attribute(),
xil_cis_get_input_type(),
xil_cis_get_output_type(),
xil_cis_attempt_recovery(),
xil_cis_get_bits_ptr()

di-292 Partial frame start adjustment err or--mismatch with buf fer start xil_decompress(),
xil_cis_number_of_frames(),
xil_cis_get_attribute(),
xil_cis_set_attribute(),
xil_cis_get_input_type(),
xil_cis_get_output_type(),
xil_cis_attempt_recovery(),
xil_cis_get_bits_ptr()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-293 Curr ent buf fer manager r ead frame unknown

Internal err or

di-294 XilCis: could not derive output type fr om data in CIS xil_decompress()

di-295 Colorspace and image�s number of bands mismatch xil_set_colorspace()

di-296 Invalid NULL colorspace speci�ed xil_color_convert(). An internal

error.

di-297 Could not copy colorspace xil_color_convert(). An internal error.

di-298 Could not cr eate colorspace xil_open(). An internal err or, probably due to r unning out of memory .

di-299 Number of bands in destination image does not match lookup table xil_lookup()

di-300 Could not cr eate internal fax compr essor xil_compress()

di-301 Invalid NULL X r egion speci�ed xil_roi_add_region()

di-302 Invalid color cube multipliers xil_colorcube_create()

di-303 XilCis: Invalid Cell key frame interval — negative xil_cis_set_attribute()
(KEYFRAME_INTERVAL)

di-304 XilCis: Illegal seek backwar d in a non-random access CIS xil_cis_seek()

di-305 Bad value for Xil_boolean type xil_cis_set_attribute()
(TEMPORAL_FILTERING,
COLORMAP_ADAPTATION)

di-306 XilCis: Cell colormaps must contain at least 2 colors xil_cis_set_attribute()
(COMPRESSOR_MAX_CMAP_SIZE,
COMPRESSOR_COLORMAP)

di-307 Cell colormaps cannot contain mor e than 256 colors xil_cis_set_attribute()
(COMPRESSOR_MAX_CMAP_SIZE)

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-308 XilCis: Cell COMPRESSOR_MAX_ CMAP_SIZE attribute cannot be changed after �rst xil_compr ess() call xil_cis_set_attribute()
(COMPRESSOR_MAX_CMAP_SIZE)

di-310 XilCis: Quantizer value out of range xil_cis_set_attribute()
(QUANTIZATION_TABLE)

di-311 XilCis: Failur e decompr essing Cell header xil_decompress()

do-312 XilCis: Illegal H.261 bitstr eam xil_decompress()

di-313 Compr essor for px64 device compr ession not yet implemented xil_compress()

di-314 XilCis: unable to sync up with curr ent frame PSC in H.261 bitstr eam xil_decompress()

di-315 XIL I/O Driver: uname system call failed xil_create_from_window()

di-316 XIL Xlib I/O Driver: could not get ximage xil_get_pixel()

di-317 XilCis: Error in seeking. No frames to skip/burn xil_cis_seek()

di-318 XilCis: attribute err or: value must be either TRUE or FALSE xil_cis_set_attribute()

di-319 XilCis: no user data established for alr eady scanned Mpeg frame xil_cis_seek()

di-320 XIL I/O Driver: could not get frame buf fer info xil_create_from_window()

di-321 Cannot r esize a child image Internal err or

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-322 Cannot r esize non-device images

Internal err or

di-323 Compr essor for MPEG-1 device compr ession not yet implemented xil_compress()

di-324 XilCis: attribute err or: value out of range xil_cis_set_attribute()

di-325 XilCis: D (DC intra-coded) frame type not supported xil_decompress()

di-326 Because of Bug ID # 1 139760, di-326 prints the err or message for di-325. The correct err or message for di- 326 is: Matrix size does not match with sr c or dst number of bands xil_band_combine()

di-327 Tried to use an invalid image in an operation

Any operations with an image that becomes invalid. An image becomes invalid when an operation that is supposed to write to it fails.

di-328 Internal err or in ROI scan conversion

Internal err or

di-329 XilCis: Mpeg1 bitstr eam error, incomplete frame

Any r outine that involves a seek operation within a CIS

di-330 XIL Xlib I/O Driver: could not captur e image — window not mapped xil_copy()

di-331 Null lookup list or zer o number of lookups to combine xil_lookup_create_combined()

di-332 Input type of lookups ar e not of same type xil_lookup_create_combined()

di-333 Output type of lookups ar e not of same type xil_lookup_create_combined()

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-334 Not all lookups have a single band xil_lookup_create_combined()

di-335 Requested lookup table doesn’t exist -- num_bands too lar ge xil_lookup_create_combined()

di-336 Wrong lookup type -- not a combined lookup object xil_lookup_create_combined()

di-337 XilCis: wrote mor e than max_frame_size bytes into frame xil_compr ess()

di-338 XilCis: moveEndStart err or, read frame must be at end of buffer xil_cis_get_bits_ptr()

di-339 XilCis: moveEndStart err or, read frame must have following frame xil_cis_get_bits_ptr()

di-340 XilCis: removeStartFrame error, read frame must be start of buf fer xil_cis_get_bits_ptr()

di-341 XilCis: mpeg1 seek, prev_nonbframe_id is frame which alr eady has valid display_id xil_cis_seek(), xil_decompr ess() for MPEG-1 CIS

di-342 XilCis: doneBuf ferSpace called with negative number of bytes, illegal xil_compr ess()

di-343 Unsupported edge detection method xil_edge_detection()

di-344 Invalid NULL attribute speci�ed xil_attribute_set_value(), xil_device_cr eate()

di-347 ROI rectangle width/height cannot be <= 0

Any function that passes an image as an argument

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B

di-348 NULL warp table speci�ed xil_tablewarp(),

xil_tablewarp_horizontal(),
xil_tablewarp_vertical()

di-349 Warp table datatype mismatch xil_tablewarp(),
xil_tablewarp_horizontal(),
xil_tablewarp_vertical()

di-350 Warp table nbands mismatch xil_tablewarp(),

xil_tablewarp_horizontal(),
xil_tablewarp_vertical()

di-351 Could not cr eate Interpolation T able xil_af�ne(), xil_interpolation_table_cr eate(), xil_rotate(), xil_scale(), xil_tablewarp(), xil_tablewarp_horizontal(), xil_tablewarp_vertical(), xil_translate()

di-352 Invalid NULL Interpolation Table speci�ed xil_interpolation_table_create()

di-354 X & Y skip values must have value gr eater than 0 xil_histogram(), xil_histogram_cr eate()

di-356 Can not open speci�ed data �le(s)

Could occur with any function whose sour ce image is a Photo CD device image.

di-358 width and height must be de�ned befor e parsing XilCis xil_decompr ess() of a CellB CIS

di-359 Cannot r ead fr om a writeonly device

Could occur with any function that tries to read fr om a write-only device

di-360 Cannot write to a r ead-only device

Could occur with any function that tries to write to a r ead-only device

TableB-1 XIL Library Err or Messages

Error Number Error Message Function That Generates Error

B