xil_cis_get_attribute (3) XILImaging Library

NAME xil_cis_get_attribute, xil_cis_set_attribute − get and set a compressor attribute

SYNOPSIS #include <xil/xil.h> int xil_cis_get_attribute (XilCis cis, char ∗attribute , void ∗∗value);

int xil_cis_set_attribute (XilCis cis, char ∗attribute, void ∗data);

DESCRIPTION xil_cis_get_attribute () returns the value of the attribute of the cis (the specified compressed image sequence).

xil_cis_set_attribute () sets attribute of cis to data, a generic pointer to the attribute value.

Available attributes are described on the specific man pages for the compressors and decompressors available with the XILlibrary, including the following: Jpeg (3) (baseline

JPEG), JpegLL (3) (lossless JPEG), Cell (3) (image compression technology developed by

Sun), CellB (3) (video compression technology developed by Sun), faxG3 (3) and faxG4 (3)

(for CCITT Group 3 and Group 4 facsimile devices), Mpeg1 (3) (basic MPEG video compression), H261(3) (CCITT Recommendation H.261, Video Codec for Audiovisual

Services at px64 kbits/s).

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES This example sets a JPEG CIS attribute called ENCODE_INTERLEAVED to TRUE.

XilCis cis;

xil_cis_set_attribute(cis,"ENCODE_INTERLEAVED", (void ∗) TRUE);

This example returns the value of a JPEG CIS attribute called ENCODE_INTERLEAVED.

Xil_boolean encode_type;

XilCis cis;

xil_cis_get_attribute(cis, "ENCODE_INTERLEAVED", (void ∗∗) &encode_type);

NOTES The xil_cis_set_attribute () and xil_cis_get_attribute () calls are used to modify the default behavior of a specific compressor. Generic attributes of compressors are set by individual function calls.

XILImaging Library xil_cis_get_attribute (3)

SEE ALSO xil_compress (3), xil_cis_create (3), xil_choose_colormap (3), xil_decompress (3), xil_open (3), xil_cis_get_bits_ptr (3), xil_cis_get_compression_type (3), xil_cis_get_compressor (3), xil_cis_get_input_type (3), xil_cis_get_max_frames (3), xil_cis_get_output_type (3), xil_cis_get_start_frame (3), xil_cis_has_data (3), xil_cis_put_bits (3), xil_cis_reset (3), Jpeg (3), JpegLL (3), Cell (3), CellB (3), faxG3 (3), faxG4(3), Mpeg1 (3), H261(3).