XILImaging Library xil_cis_sync (3)

NAME xil_cis_sync − force any outstanding call to xil_compress (3) to complete when it would otherwise have been deferred

SYNOPSIS #include <xil/xil.h> void xil_cis_sync ( XilCis cis);

DESCRIPTION xil_cis_sync () forces any outstanding calls to xil_compress (3) to complete. This forces the actual capture and compress to occur immediately instead of being deferred as part of an XILmolecule.

In order to execute multiple operations as a molecule, XILdefers the operations until they are needed. Thus, if a call to xil_compress () is part of a molecule, the capture and compression occurs when the deferred molecule is executed, not at the time that the xil_compress () function is called.

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES Measure the performance of a compress operation:

starttime= gmtime(NULL); /∗ get the start time ∗/ xil_compress(src,cis); /∗ compress the image ∗/ xil_cis_sync(cis); /∗ force the compress to actually happen ∗/ endtime= gmtime(NULL); /∗ get the finish time ∗/

NOTES This function does not produce any semantic differences in the execution of the program.

modified 09 June 1993 105