xil_dithermask_get_height (3) XILImaging Library

NAME xil_dithermask_get_height, xil_dithermask_get_width, xil_dithermask_get_nbands − read attributes of dither mask objects

SYNOPSIS #include <xil/xil.h> unsigned int xil_dithermask_get_height ( XilDitherMask mask);

unsigned int xil_dithermask_get_width ( XilDitherMask mask);

unsigned int xil_dithermask_get_nbands ( XilDitherMask mask);

DESCRIPTION These routines control access to the dither mask object used in the xil_ordered_dither (3) operation. In each routine, mask is a handle to a dither mask.

xil_dithermask_get_width () gets the width of the specified dither mask.

xil_dithermask_get_nbands () gets the number of bands in the specified dither mask.

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES Get the dimensions of a dither mask:

XilDithermask dithermask;

unsigned int width, height, nbands;

width = xil_dithermask_get_width (dithermask);

height = xil_dithermask_get_height (dithermask);

nbands = xil_dithermask_get_nbands (dithermask);

SEE ALSO xil_dithermask_create (3), xil_dithermask_get_by_name (3).

134 modified 16 August 1993