XILImaging Library xil_squeeze_range (3)

NAME xil_squeeze_range − produce a lookup table that will map an image into contiguous entries

SYNOPSIS #include <xil/xil.h>

XilLookup xil_squeeze_range ( XilImage src);

DESCRIPTION This function examines the source image, src, and produces a lookup table that will map src into an image with contiguous entries. src must be a single-banded image. Both src and the image’s colormap must be passed through the resulting lookup table for it to be displayed correctly.

RETURN VALUES NULL if function fails

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES Produce a lookup table that will map an image into continuous entries:

XilLookup result_lut;

XilImage src;

result_lut = xil_squeeze_range(src);

SEE ALSO xil_lookup (3) modified 16 June 1993 245