Index A Arithmetic and Logical Operations xil_absolute, 67 xil_add, 68 xil_add_const, 68 xil_and, 70 xil_and_const, 70 xil_divide, 135 xil_divide_by_const, 135 xil_divide_into_const, 135 xil_max, 204 xil_min, 205 xil_multiply, 206 xil_multiply_const, 206 xil_not, 208 xil_or, 210 xil_or_const, 210 xil_subtract, 251 xil_subtract_const, 251 xil_subtract_from_const, 251 xil_xor, 262 xil_xor_const, 262

Attribute Functions xil_device_create, 129 xil_device_destroy, 129 xil_device_set_value, 130

C CCITT Group 3 and Group 4 compressors decompression attributes, 29 faxG3, 29 faxG4, 29 overview, 29

Cell, 20 compression attributes, 20 decompression attributes, 24 overview, 20

CellB, 27 attributes, 27 overview, 27

CIS Functions xil_cis_create, 81 xil_cis_destroy, 82 xil_cis_get_attribute, 84 xil_cis_get_by_name, 88 xil_cis_get_compression_type, 89 xil_cis_get_compressor, 90 xil_cis_get_input_type, 91 xil_cis_get_keep_frames, 92 xil_cis_get_max_frames, 92 xil_cis_get_name, 88 xil_cis_get_output_type, 94 xil_cis_get_random_access, 95 xil_cis_get_read_frame, 97 xil_cis_get_start_frame, 97 xil_cis_get_write_frame, 97

CIS Functions, continued xil_cis_set_attribute, 84 xil_cis_set_keep_frames, 92 xil_cis_set_max_frames, 92 xil_cis_set_name, 88 xil_cis_sync, 105

Color Operations xil_black_generation, 73 xil_color_convert, 106 D Dither Mask xil_dithermask_get_name, 132 xil_dithermask_set_name, 132

Dither Mask Functions xil_dithermask_create, 131 xil_dithermask_create_copy, 131 xil_dithermask_destroy, 131 xil_dithermask_get_by_name, 132 xil_dithermask_get_nbands, 134 xil_dithermask_get_width, 134 E Error Handling Functions xil_call_next_error_handler, 179 xil_default_error_handler, 179 xil_error_get_category, 142 xil_error_get_category_string, 142 xil_error_get_id, 142 xil_error_get_location, 142 xil_error_get_object, 142 xil_error_get_primary, 142 xil_error_get_string, 142 xil_install_error_handler, 179 xil_object_get_error_string, 143 xil_object_get_type, 143 xil_remove_error_handler, 179 F Fax decompression attributes, 29 faxG3, 29 faxG4, 29 overview, 29

Functions

Functions, continued

Cell, 20

CellB, 27 faxG3, 29 faxG4, 29

H.261, 32

Jpeg, 38

JpegLL, 47

Mpeg1, 53

PhotoCD, 62 xgl_to_xil, 257 xil_absolute, 67 xil_add, 68 xil_add_const, 68 xil_affine, 69 xil_and, 70 xil_and_const, 70 xil_band_combine, 71 xil_black_generation, 73 xil_blend, 74 xil_call_next_error_handler, 179 xil_cast, 75 xil_choose_colormap, 76 xil_cis_attempt_recovery, 77 xil_cis_create, 81 xil_cis_destroy, 82 xil_cis_flush, 83 xil_cis_get_attribute, 84 xil_cis_get_autorecover, 86 xil_cis_get_bits_ptr, 87 xil_cis_get_by_name, 88 xil_cis_get_compression_type, 89 xil_cis_get_compressor, 90 xil_cis_get_input_type, 91 xil_cis_get_keep_frames, 92 xil_cis_get_max_frames, 92 xil_cis_get_name, 88 xil_cis_get_output_type, 94 xil_cis_get_random_access, 95 xil_cis_get_read_frame, 97 xil_cis_get_read_invalid, 96 xil_cis_get_start_frame, 97 xil_cis_get_write_frame, 97 xil_cis_get_write_invalid, 98 xil_cis_has_data, 99

Functions, continued xil_cis_has_frame, 99 xil_cis_number_of_frames, 99 xil_cis_put_bits, 101 xil_cis_put_bits_ptr, 101 xil_cis_reset, 103 xil_cis_seek, 104 xil_cis_set_attribute, 84 xil_cis_set_autorecover, 86 xil_cis_set_keep_frames, 92 xil_cis_set_max_frames, 92 xil_cis_set_name, 88 xil_cis_sync, 105 xil_close, 209 xil_color_convert, 106 xil_colorcube_create, 107 xil_colorspace_get_by_name, 109 xil_compress, 111 xil_convolve, 113 xil_copy, 115 xil_copy_pattern, 116 xil_copy_with_planemask, 117 xil_create, 119 xil_create_child, 121 xil_create_copy, 123 xil_create_from_device, 125 xil_create_from_type, 124 xil_create_from_window, 125 xil_decompress, 127 xil_default_error_handler, 179 xil_destroy, 128 xil_device_create, 129 xil_device_destroy, 129 xil_device_set_value, 130 xil_dilate, 139 xil_dithermask_create, 131 xil_dithermask_create_copy, 131 xil_dithermask_destroy, 131 xil_dithermask_get_by_name, 132 xil_dithermask_get_name, 132 xil_dithermask_get_nbands, 134 xil_dithermask_get_width, 134 xil_dithermask_set_name, 132 xil_divide, 135 xil_divide_by_const, 135

Functions, continued xil_divide_into_const, 135 xil_edge_detection, 137 xil_erode, 139 xil_error_diffusion, 141 xil_error_get_category, 142 xil_error_get_category_string, 142 xil_error_get_id, 142 xil_error_get_location, 142 xil_error_get_object, 142 xil_error_get_primary, 142 xil_error_get_string, 142 xil_export, 145 xil_extrema, 147 xil_fill, 148 xil_get_attribute, 149 xil_get_by_name, 151 xil_get_child_offsets, 153 xil_get_datatype, 154 xil_get_device_attribute, 155 xil_get_exported, 145 xil_get_height, 167 xil_get_imagetype, 157 xil_get_info, 158 xil_get_memory_storage, 159 xil_get_name, 151 xil_get_nbands, 167 xil_get_origin, 162 xil_get_origin_x, 162 xil_get_origin_y, 162 xil_get_parent, 164 xil_get_pixel, 240 xil_get_readable, 165 xil_get_roi, 166 xil_get_size, 167 xil_get_synchronize, 253 xil_get_width, 167 xil_get_writable, 165 xil_histogram, 168 xil_histogram_create, 169 xil_histogram_destroy, 169 xil_histogram_get_by_name, 170 xil_histogram_get_info, 172 xil_histogram_get_limits, 172 xil_histogram_get_name, 170

Functions, continued xil_histogram_get_nbands, 172 xil_histogram_get_nbins, 172 xil_histogram_get_values, 172 xil_histogram_set_name, 170 xil_imagetype_get_by_name, 174 xil_imagetype_get_datatype, 176 xil_imagetype_get_height, 178 xil_imagetype_get_info, 177 xil_imagetype_get_name, 174 xil_imagetype_get_nbands, 178 xil_imagetype_get_size, 178 xil_imagetype_get_width, 178 xil_imagetype_set_name, 174 xil_import, 145 xil_install_error_handler, 179 xil_interpolation_table_create, 181 xil_interpolation_table_destroy, 181 xil_interpolation_table_get_data, 183 xil_interpolation_table_get_kernel_size, 184 xil_interpolation_table_get_subsamples, 185 xil_kernel_create, 186 xil_kernel_create_copy, 186 xil_kernel_destroy, 186 xil_kernel_get_by_name, 187 xil_kernel_get_height, 189 xil_kernel_get_key_x, 189 xil_kernel_get_key_y, 189 xil_kernel_get_name, 187 xil_kernel_get_width, 189 xil_kernel_set_name, 187 xil_lookup, 190 xil_lookup_convert, 191 xil_lookup_create, 192 xil_lookup_create_combined, 194 xil_lookup_create_copy, 193 xil_lookup_destroy, 193 xil_lookup_get_by_name, 197 xil_lookup_get_colorcube, 107 xil_lookup_get_colorcube_info, 107 xil_lookup_get_input_datatype, 199 xil_lookup_get_input_nbands, 199 xil_lookup_get_name, 197 xil_lookup_get_num_entries, 199 xil_lookup_get_offset, 199

Functions, continued xil_lookup_get_output_datatype, 199 xil_lookup_get_output_nbands, 199 xil_lookup_get_values, 202 xil_lookup_get_version, 201 xil_lookup_set_name, 197 xil_lookup_set_offset, 199 xil_lookup_set_values, 202 xil_max, 204 xil_min, 205 xil_multiply, 206 xil_multiply_const, 206 xil_nearest_color, 207 xil_not, 208 xil_object_get_error_string, 143 xil_object_get_type, 143 xil_open, 209 xil_or, 210 xil_or_const, 210 xil_ordered_dither, 211 xil_paint, 213 xil_remove_error_handler, 179 xil_rescale, 215 xil_roi_add_image, 217 xil_roi_add_rect, 218 xil_roi_add_region, 219 xil_roi_create, 220 xil_roi_create_copy, 220 xil_roi_get_as_image, 223 xil_roi_get_as_region, 224 xil_roi_get_by_name, 225 xil_roi_get_name, 225 xil_roi_intersect, 227 xil_roi_set_name, 225 xil_roi_subtract_rect, 228 xil_roi_translate, 229 xil_roi_unite, 230 xil_rotate, 231 xil_scale, 232 xil_sel_create, 233 xil_sel_create_copy, 233 xil_sel_destroy, 233 xil_sel_get_by_name, 235 xil_sel_get_height, 237 xil_sel_get_key_x, 237

Functions, continued xil_sel_get_key_y, 237 xil_sel_get_name, 235 xil_sel_get_width, 237 xil_sel_set_name, 235 xil_set_attribute, 149 xil_set_colorspace, 238 xil_set_device_attribute, 155 xil_set_memory_storage, 160 xil_set_name, 151 xil_set_origin, 162 xil_set_pixel, 240 xil_set_roi, 166 xil_set_synchronize, 253 xil_set_value, 242 xil_soft_fill, 243 xil_squeeze_range, 245 xil_state_get_interpolation_tables, 246 xil_state_get_show_action, 247 xil_state_get_synchronize, 253 xil_state_set_interpolation_tables, 246 xil_state_set_show_action, 247 xil_state_set_synchronize, 253 xil_subsample_adaptive, 249 xil_subsample_binary_to_gray, 250 xil_subtract, 251 xil_subtract_const, 251 xil_subtract_from_const, 251 xil_sync, 253 xil_tablewarp, 254 xil_threshold, 256 xil_to_xgl, 257 xil_toss, 259 xil_translate, 260 xil_transpose, 261 xil_xor, 262 xil_xor_const, 262 G General Utility Functions xil_close, 209 xil_open, 209

Geometric Operations xil_affine, 69 xil_rotate, 231

Geometric Operations, continued xil_scale, 232 xil_subsample_adaptive, 249 xil_subsample_binary_to_gray, 250 xil_tablewarp, 254 xil_translate, 260 xil_transpose, 261 H H.261, 32 compression attributes, 32 decompression attributes, 35 overview, 32

Histogram Functions xil_histogram_create, 169 xil_histogram_destroy, 169 xil_histogram_get_by_name, 170 xil_histogram_get_info, 172 xil_histogram_get_limits, 172 xil_histogram_get_name, 170 xil_histogram_get_nbands, 172 xil_histogram_get_nbins, 172 xil_histogram_get_values, 172 xil_histogram_set_name, 170 I Image Functions colorspace overview, 238 image overview, 119 origin overview, 162 xil_colorspace_get_by_name, 109 xil_create, 119 xil_create_child, 121 xil_create_copy, 123 xil_create_from_device, 125 xil_create_from_type, 124 xil_create_from_window, 125 xil_destroy, 128 xil_export, 145 xil_get_attribute, 149 xil_get_by_name, 151 xil_get_child_offsets, 153 xil_get_datatype, 154 xil_get_device_attribute, 155 xil_get_device_readable, 165

Image Functions, continued xil_get_exported, 145 xil_get_height, 167 xil_get_imagetype, 157 xil_get_info, 158 xil_get_memory_storage, 159 xil_get_name, 151 xil_get_nbands, 167 xil_get_origin, 162 xil_get_origin_x, 162 xil_get_origin_y, 162 xil_get_parent, 164 xil_get_roi, 166 xil_get_size, 167 xil_get_synchronize, 253 xil_get_width, 167 xil_get_writable, 165 xil_import, 145 xil_set_attribute, 149 xil_set_colorspace, 238 xil_set_device_attribute, 155 xil_set_memory_storage, 160 xil_set_name, 151 xil_set_origin, 162 xil_set_roi, 166 xil_set_synchronize, 253 xil_state_get_interpolation_tables, 246 xil_state_get_show_action, 247 xil_state_get_synchronize, 253 xil_state_set_interpolation_tables, 246 xil_state_set_show_action, 247 xil_state_set_synchronize, 253 xil_sync, 253 xil_toss, 259

Image Processing Operations xil_band_combine, 71 xil_blend, 74 xil_cast, 75 xil_convolve, 113 xil_copy, 115 xil_copy_pattern, 116 xil_copy_with_planemask, 117 xil_dilate, 139 xil_edge_detection, 137 xil_erode, 139

Image Processing Operations, continued xil_extrema, 147 xil_get_pixel, 240 xil_histogram, 168 xil_lookup, 190 xil_rescale, 215 xil_set_pixel, 240 xil_set_value, 242 xil_tablewarp, 254 xil_threshold, 256

Image Type Functions xil_imagetype_get_by_name, 174 xil_imagetype_get_datatype, 176 xil_imagetype_get_height, 178 xil_imagetype_get_info, 177 xil_imagetype_get_name, 174 xil_imagetype_get_nbands, 178 xil_imagetype_get_size, 178 xil_imagetype_get_width, 178 xil_imagetype_set_name, 174

Interpolation Table Functions xil_interpolation_table_create, 181 xil_interpolation_table_destroy, 181 xil_interpolation_table_get_data, 183 xil_interpolation_table_get_kernel_size, 184 xil_interpolation_table_get_subsamples, 185 J Jpeg, 38 compression attributes, 38 decompression attributes, 44 overview, 38

JPEG Lossless compression attributes, 47

JpegLL, 47 overview, 47 K Kernel Functions kernel overview, 186 xil_kernel_create, 186 xil_kernel_create_copy, 186 xil_kernel_destroy, 186 xil_kernel_get_by_name, 187 xil_kernel_get_height, 189

Kernel Functions, continued xil_kernel_get_key_x, 189 xil_kernel_get_key_y, 189 xil_kernel_get_name, 187 xil_kernel_get_width, 189 xil_kernel_set_name, 187 L Lookup Table Functions xil_colorcube_create, 107 xil_lookup_create, 192 xil_lookup_create_combined, 194 xil_lookup_create_copy, 193 xil_lookup_destroy, 193 xil_lookup_get_by_name, 197 xil_lookup_get_colorcube, 107 xil_lookup_get_colorcube_info, 107 xil_lookup_get_input_datatype, 199 xil_lookup_get_input_nbands, 199 xil_lookup_get_name, 197 xil_lookup_get_num_entries, 199 xil_lookup_get_offset, 199 xil_lookup_get_output_datatype, 199 xil_lookup_get_output_nbands, 199 xil_lookup_get_values, 202 xil_lookup_get_version, 201 xil_lookup_set_name, 197 xil_lookup_set_offset, 199 xil_lookup_set_values, 202 M Mpeg1, 53 compression attributes, 53 decompression, 58 overview, 53 P PhotoCD, 62 attributes, 62 overview, 62

Planemask Operations xil_copy_with_planemask, 117

Presentation Functions xil_choose_colormap, 76 xil_error_diffusion, 141

Presentation Functions, continued xil_fill, 148 xil_lookup_convert, 191 xil_nearest_color, 207 xil_ordered_dither, 211 xil_paint, 213 xil_soft_fill, 243 xil_squeeze_range, 245 R ROI Functions

ROI overview, 220 xil_roi_add_image, 217 xil_roi_add_rect, 218 xil_roi_add_region, 219 xil_roi_create, 220 xil_roi_create_copy, 220 xil_roi_get_as_image, 223 xil_roi_get_as_region, 224 xil_roi_get_by_name, 225 xil_roi_get_name, 225 xil_roi_intersect, 227 xil_roi_set_name, 225 xil_roi_subtract_rect, 228 xil_roi_translate, 229 xil_roi_unite, 230 S SEL Functions xil_sel_create, 233 xil_sel_create_copy, 233 xil_sel_destroy, 233 xil_sel_get_by_name, 235 xil_sel_get_height, 237 xil_sel_get_key_x, 237 xil_sel_get_key_y, 237 xil_sel_get_name, 235 xil_sel_get_width, 237 xil_sel_set_name, 235 U Utilities xgl_to_xil, 257 xil_to_xgl, 257

V Video Compression Functions xil_cis_attempt_recovery, 77 xil_cis_flush, 83 xil_cis_get_autorecover, 86 xil_cis_get_bits_ptr, 87 xil_cis_get_read_invalid, 96 xil_cis_get_write_invalid, 98 xil_cis_has_data, 99 xil_cis_has_frame, 99 xil_cis_number_of_frames, 99 xil_cis_put_bits, 101 xil_cis_put_bits_ptr, 101 xil_cis_reset, 103 xil_cis_seek, 104 xil_cis_set_autorecover, 86 xil_compress, 111 xil_decompress, 127 X xgl_to_xil, 257 xil_absolute, 67 xil_add, 68 xil_add_const, 68 xil_affine, 69 xil_and, 70 xil_and_const, 70 xil_band_combine, 71 xil_black_generation, 73 xil_blend, 74 xil_call_next_error_handler, 179 xil_cast, 75 xil_choose_colormap, 76 xil_cis_attempt_recovery, 77 xil_cis_create, 81 xil_cis_destroy, 82 xil_cis_flush, 83 xil_cis_get_attribute, 84 xil_cis_get_autorecover, 86 xil_cis_get_bits_ptr, 87 xil_cis_get_by_name, 88 xil_cis_get_compression_type, 89 xil_cis_get_compressor, 90

xil_cis_get_input_type, 91 xil_cis_get_keep_frames, 92 xil_cis_get_max_frames, 92 xil_cis_get_name, 88 xil_cis_get_output_type, 94 xil_cis_get_random_access, 95 xil_cis_get_read_frame, 97 xil_cis_get_read_invalid, 96 xil_cis_get_start_frame, 97 xil_cis_get_write_frame, 97 xil_cis_get_write_invalid, 98 xil_cis_has_data, 99 xil_cis_has_frame, 99 xil_cis_number_of_frames, 99 xil_cis_put_bits, 101 xil_cis_put_bits_ptr, 101 xil_cis_reset, 103 xil_cis_seek, 104 xil_cis_set_attribute, 84 xil_cis_set_autorecover, 86 xil_cis_set_keep_frames, 92 xil_cis_set_max_frames, 92 xil_cis_set_name, 88 xil_cis_sync, 105 xil_close, 209 xil_color_convert, 106 xil_colorcube_create, 107 xil_colorspace_get_by_name, 109 xil_compress, 111 xil_convolve, 113 xil_copy, 115 xil_copy_pattern, 116 xil_copy_with_planemask, 117 xil_create, 119 xil_create_child, 121 xil_create_copy, 123 xil_create_from_device, 125 xil_create_from_type, 124 xil_create_from_window, 125 xil_decompress, 127 xil_default_error_handler, 179 xil_destroy, 128 xil_device_create, 129 xil_device_destroy, 129 xil_device_set_value, 130 xil_dilate, 139 xil_dithermask_create, 131 xil_dithermask_create_copy, 131 xil_dithermask_destroy, 131 xil_dithermask_get_by_name, 132 xil_dithermask_get_name, 132 xil_dithermask_get_nbands, 134 xil_dithermask_get_width, 134 xil_dithermask_set_name, 132 xil_divide, 135 xil_divide_by_const, 135 xil_divide_into_const, 135 xil_edge_detection, 137 xil_erode, 139 xil_error_diffusion, 141 xil_error_get_category, 142 xil_error_get_category_string, 142 xil_error_get_id, 142 xil_error_get_location, 142 xil_error_get_object, 142 xil_error_get_primary, 142 xil_error_get_string, 142 xil_export, 145 xil_extrema, 147 xil_fill, 148 xil_get_attribute, 149 xil_get_by_name, 151 xil_get_child_offsets, 153 xil_get_datatype, 154 xil_get_device_attribute, 155 xil_get_exported, 145 xil_get_height, 167 xil_get_imagetype, 157 xil_get_info, 158 xil_get_memory_storage, 159 xil_get_name, 151 xil_get_nbands, 167 xil_get_origin, 162 xil_get_origin_x, 162

xil_get_origin_y, 162 xil_get_parent, 164 xil_get_pixel, 240 xil_get_readable, 165 xil_get_roi, 166 xil_get_size, 167 xil_get_synchronize, 253 xil_get_width, 167 xil_get_writable, 165 xil_histogram, 168 xil_histogram_create, 169 xil_histogram_destroy, 169 xil_histogram_get_by_name, 170 xil_histogram_get_info, 172 xil_histogram_get_limits, 172 xil_histogram_get_name, 170 xil_histogram_get_nbands, 172 xil_histogram_get_nbins, 172 xil_histogram_get_values, 172 xil_histogram_set_name, 170 xil_imagetype_get_by_name, 174 xil_imagetype_get_datatype, 176 xil_imagetype_get_height, 178 xil_imagetype_get_info, 177 xil_imagetype_get_name, 174 xil_imagetype_get_nbands, 178 xil_imagetype_get_size, 178 xil_imagetype_get_width, 178 xil_imagetype_set_name, 174 xil_import, 145 xil_install_error_handler, 179 xil_interpolation_table_create, 181 xil_interpolation_table_destroy, 181 xil_interpolation_table_get_data, 183 xil_interpolation_table_get_kernel_size, 184 xil_interpolation_table_get_subsamples, 185 xil_kernel_create, 186 xil_kernel_create_copy, 186 xil_kernel_destroy, 186 xil_kernel_get_by_name, 187 xil_kernel_get_height, 189 xil_kernel_get_key_x, 189 xil_kernel_get_key_y, 189 xil_kernel_get_name, 187 xil_kernel_get_width, 189 xil_kernel_set_name, 187 xil_lookup, 190 xil_lookup_convert, 191 xil_lookup_create, 192 xil_lookup_create_combined, 194 xil_lookup_create_copy, 193 xil_lookup_destroy, 193 xil_lookup_get_by_name, 197 xil_lookup_get_colorcube, 107 xil_lookup_get_colorcube_info, 107 xil_lookup_get_input_datatype, 199 xil_lookup_get_input_nbands, 199 xil_lookup_get_name, 197 xil_lookup_get_num_entries, 199 xil_lookup_get_offset, 199 xil_lookup_get_output_datatype, 199 xil_lookup_get_output_nbands, 199 xil_lookup_get_values, 202 xil_lookup_get_version, 201 xil_lookup_set_name, 197 xil_lookup_set_offset, 199 xil_lookup_set_values, 202 xil_max, 204 xil_min, 205 xil_multiply, 206 xil_multiply_const, 206 xil_nearest_color, 207 xil_not, 208 xil_object_get_error_string, 143 xil_object_get_type, 143 xil_open, 209 xil_or, 210 xil_or_const, 210 xil_ordered_dither, 211 xil_paint, 213 xil_remove_error_handler, 179 xil_rescale, 215 xil_roi_add_image, 217 xil_roi_add_rect, 218

xil_roi_add_region, 219 xil_roi_create, 220 xil_roi_create_copy, 220 xil_roi_get_as_image, 223 xil_roi_get_as_region, 224 xil_roi_get_by_name, 225 xil_roi_get_name, 225 xil_roi_intersect, 227 xil_roi_set_name, 225 xil_roi_subtract_rect, 228 xil_roi_translate, 229 xil_roi_unite, 230 xil_rotate, 231 xil_scale, 232 xil_sel_create, 233 xil_sel_create_copy, 233 xil_sel_destroy, 233 xil_sel_get_by_name, 235 xil_sel_get_height, 237 xil_sel_get_key_x, 237 xil_sel_get_key_y, 237 xil_sel_get_name, 235 xil_sel_get_width, 237 xil_sel_set_name, 235 xil_set_attribute, 149 xil_set_colorspace, 238 xil_set_device_attribute, 155 xil_set_memory_storage, 160 xil_set_name, 151 xil_set_origin, 162 xil_set_pixel, 240 xil_set_roi, 166 xil_set_synchronize, 253 xil_set_value, 242 xil_soft_fill, 243 xil_squeeze_range, 245 xil_state_get_interpolation_tables, 246 xil_state_get_show_action, 247 xil_state_get_synchronize, 253 xil_state_set_interpolation_tables, 246 xil_state_set_show_action, 247 xil_state_set_synchronize, 253 xil_subsample_adaptive, 249 xil_subsample_binary_to_gray, 250 xil_subtract, 251 xil_subtract_const, 251 xil_subtract_from_const, 251 xil_sync, 253 xil_tablewarp, 254 xil_threshold, 256 xil_to_xgl, 257 xil_toss, 259 xil_translate, 260 xil_transpose, 261 xil_xor, 262 xil_xor_const, 262