XILImaging Library xil_cis_create (3)

NAME xil_cis_create − create a new compressed image sequence

SYNOPSIS #include <xil/xil.h>

XilCis xil_cis_create ( XilSystemState system_state, char ∗compressorname);

DESCRIPTION This function creates a new compressed image sequence (CIS). A CIS is a container that holds compressed images for a particular type of compression. Therefore, the CIS type must match the compression type. system_state is a handle to the object returned by xil_open (3) when it is invoked. compressornameis a string that provides the name of a compressor recognized by the XILlibrary.

If this function is successful, then a handle to an XilCis object is returned, which may be used in subsequent calls to xil_cis-routines. When the XilCis object is no longer needed, release the resources associated with the CIS by passing its handle to xil_cis_destroy (3).

The XILlibrary currently supports the following compressors: "Jpeg", "JpegLL", "Cell",

"CellB", "faxG3", "faxG4", "Mpeg1", and "H261". Consult the following man pages for descriptions of these compressors and their attributes: Jpeg (3), JpegLL (3), Cell (3),

CellB (3), faxG3 (3), faxG4 (3), Mpeg1 (3), and H261(3).

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES Open and close a JPEG CIS using the XILlibrary:

XilSystemState State;

XilCis cis;

State = xil_open( );

cis = xil_cis_create(State, "Jpeg ");

-- calls to JPEG-specific compression routines -- xil_cis_destroy(cis);

xil_close(State);

SEE ALSO xil_open (3), xil_close (3), xil_cis_destroy (3), xil_cis_flush (3), xil_cis_put_bits (3), xil_cis_reset (3), xil_cis_seek (3), xil_compress (3), xil_decompress (3).

modified 18 August 1993 81