XILImaging Library xil_cis_reset (3)

NAME xil_cis_reset − clears data in a compressed image sequence

SYNOPSIS #include <xil/xil.h> void xil_cis_reset (XilCis cis);

DESCRIPTION This function removes any compressed data currently stored in the specified compressed image sequence and sets the cis state parameters to their intitial values. cis is the compressed image sequence that contains the data to be cleared.

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES XilCis cis;

xil_cis_reset(cis);

SEE ALSO xil_compress (3) modified 13 August 1993 103