XILImaging Library xil_get_width (3)

NAME xil_get_width, xil_get_height, xil_get_nbands, xil_get_size − get width, height, number of bands, or size of image

SYNOPSIS #include <xil/xil.h> unsigned int xil_get_width (XilImage image);

unsigned int xil_get_height (XilImage image);

unsigned int xil_get_nbands (XilImage image);

void xil_get_size (XilImage image, unsigned int ∗width, unsigned int ∗height);

DESCRIPTION xil_get_width () gets the width of an image.

xil_get_height () gets the height of an image.

xil_get_nbands () gets the number of bands in an image.

xil_get_size () gets the width and height of an image.

These functions may be called on all images.

ERRORS For a complete list of XILerror messages by number, consult Appendix Bof the XIL

Programmer’s Guide.

EXAMPLES Get the width and height of an image:

unsigned int width, height;

XilImage image;

width = xil_get_width (image);

height = xil_get_height (image);

Or alternatively:

xil_get_size (image, ∗width, ∗height);

SEE ALSO xil_get_imagetype (3), xil_get_datatype (3), xil_get_info (3).

modified 17 August 1993 167