Unsupported Devguide Featur es B

This appendix lists Devguide featur es that the gmf code generator does not support.

Bold Labels

The OPEN LOOK speci�cation calls for the labels of all contr ol objects to be bold. When you pr ototype an interface in Devguide, the label font will appear bold. However , the default font weight for labels in gmf-generated interfaces is normal. When you r un your gmf program, the labels will not be bold.

Help

gmf does not support Help as implemented in Devguide.

Connections Between Base Windows

gmf will generate an err or message if your interface has connections between separate Base W indows.

36 Devguide: Motif Conversion Utilities Guide� August 1994

B Miscellaneous Unsupported GUI Elements

The following ar e user interface elements that ar e available in Devguide but are curr ently not supported by gmf:

¥ Icons for Base W indows ¥ Term Panes ¥ Numeric T extFields ¥ Drag and Dr op from a Canvas or a Scr olling List ¥ Slider end values

Although you can include slider end-values in your interface pr ototype in Devguide, they will not appear in your compiled application.

gmf simply ignor es most of these unsupported elements when it r eads the GIL �le. However , if you attempt to use gmf to generate code for an interface that includes term panes or numeric T extFields, gmf will convert them to text panes and text �elds, r espectively .