Tables

Table 1-1 Multithreading Terms . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 2 Table 3-1 Default Attribute Values . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 45 Table 3-2 Creating a Bound Thread . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 51 Table 4-1 Mutex Attributes Routines . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 71 Table 4-2 Mutex Scope Comparison . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 71 Table 4-3 Routines for Mutual Exclusion Locks . . . . . . . . . . . . . . . . . . . . . 76 Table 4-4 Condition Variable Attributes . . . . . . . . . . . . . . . . . . . . . . . . . . . 87 Table 4-5 Condition Variable Scope Comparison . . . . . . . . . . . . . . . . . . . 88 Table 4-6 Condition Variables Functions . . . . . . . . . . . . . . . . . . . . . . . . . . 92 Table 4-7 Routines for Semaphores . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 107 Table 5-1 Comparing POSIX and Solaris fork() Handling . . . . . . . . . . 120 Table 5-2 Async-Signal-Safe Functions . . . . . . . . . . . . . . . . . . . . . . . . . . . . 141 Table 6-1 Reentrant Functions . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 152 Table 6-2 Some MT-Safe Libraries . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 153 Table 7-1 Functions with POSIX/Solaris Semantic Differences . . . . . . . 156 Table 7-2 Compiling With and Without the _REENTRANT Flag . . . . . . . 159 xvi Multithr eaded Programming Guide� November 1995

Table 7-3 MT adb Commands . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 161 Table 7-4 Setting adb Breakpoints . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 161 Table 7-5 dbx Options for MT Programs . . . . . . . . . . . . . . . . . . . . . . . . . . 162 Table 8-1 Thread Analyzer Views . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 166 Table 9-1 Unique Solaris Threads and pthreads Features . . . . . . . . . . . . 184 Table 9-2 Solaris Threads and POSIX pthreads Comparison . . . . . . . . . . 185