Initialization Error Messages 6

The ToolTalk err or messages described in Table 6-1 can occur either when the ToolTalk service, or an application that uses the T oolTalk service, is attempting to start up.

Table6-1 Errors that may Occur During Initialization

Error Message Description Solution

ld.so: libtt.so.1.1: not found The run-time linker could not �nd the dynamic library , libtt.so.1.1.

Place a dir ectory that contains

libtt.so.1.1 in
$LD_LIBRARY_PATH. The library

should normally be in

/usr/openwin/lib.

/bin/sh: application_name: not found

The start string as installed in the ToolTalk Types Database does not correspond to an executable �le in

$PATH.

To correct this err or: a. First, start the application as it would be started without the ToolTalk service.

b. After the application has started, retry the operation that should have started the application with the ToolTalk service .

To prevent the err or from occurring again, verify that the start string in the r elevant ptype corr esponds to an executable �le in $PATH.

276 ToolTalk Reference Manual� August 1994

6

Cannot open display ttsession could not contact the server named with the -d display option or the $DISPLAY variable.

To start the session: a. Verify that the named display is running.

b. Verify that the host on which ttsession is running has

permission to connect to the named display .

ttsession: Illegal envir onment (-c or -d not speci�ed and DISPLA Y variable not set)

Neither the -d display option or the $DISPLAY variable is set. This error typically occurs when you or your client attempt to start

ttsession after you have either switched to another user name or become super user.

Set the -d display option or the $DISPLAY variable .

Table6-1 Errors that may Occur During Initialization (Continued)

Error Message Description Solution