ix

Figures

Figure 7-1 OpenWindows 3.4 Snapshot Application GUI . . . . . . . . . . . . . 60 Figure 7-2 Motif Port of Snapshot GUI (Direct Translation) . . . . . . . . . . . 61 Figure 7-3 Motif Port of Snapshot GUI (Final Port) . . . . . . . . . . . . . . . . . . 63

x Solaris CDE Motif T ransition Guide