vii

Figures

Figure 2-1 Calibrator Tool Setup Window . . . . . . . . . . . . . . . . . . . . . . . . . . 8 Figure 2-2 Selecting a Loadable Module . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10 Figure 2-3 Interface to a Loadable Module . . . . . . . . . . . . . . . . . . . . . . . . . 11 viii KCMS Calibrator Tool Loadable Interface Guide� November 1995