vii

Figures

Figure 1-1 KCMS Architecture . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 2 Figure 2-1 Converting Color Data From a Scanner to a Monitor . . . . . . . 12 Figure 2-2 Building a CCP From Two DCPs . . . . . . . . . . . . . . . . . . . . . . . . 14 Figure 2-3 Profile Load Hint Operations . . . . . . . . . . . . . . . . . . . . . . . . . . . 15 Figure 3-1 Bit Positions and Masks for Load Hints . . . . . . . . . . . . . . . . . . . 41 Figure 3-2 24-bit Color Component-Interleaved Data for RGB Pixel Image 52 viii KCMS Application Developer�s Guide� November 1995