OpenWindows Desktop 3.5 User Commands pageview (1)

NAME pageview − PostScript language previewer for OpenWindows

SYNOPSIS pageview [ − mono ] [ − w paperwidth ] [ − h paperheight ] [ − dpi dots/inch ]

[ − mcd colordensity ] [ − page pagenumber ] [ − dir directory ]

[ − left|right|upsidedown ] [ − timeout job_timeout (sec)] [ − aa ]

[ − low_memory ] [ − usage ] [ − v ] [ − verbose ] [ psfile | − ]

DESCRIPTION pageview is an interactive POSTSCRIPT previewer. pageview renders a document, a page at a time, onto an offscreen bitmap of arbitrary size, resolution and orientation. You can then adjust the viewing window’s size to see as much of the page as desired. The mouse buttons are used to position the page under the window in two different modes.

The left button moves the page in "relative mode". This allows you to move the page in a physically intuitive way. You press the left button on the page and while you drag the mouse around, the spot on the page that was under the mouse cursor when you pressed the button remains stationary relative to the cursor.

The middle button moves the page in "absolute mode". This allows you to easily get to the edges of the document, especially when the DPI is large and/or the window is small.

When you press the middle button on a point in the window, the page is adjusted so that the same relative point on the page is under the mouse. For example, if you press the middle button at the top right corner of the window, you will see the top right corner of the page. A little experimentation with a page at 300 dpi and you will find this mode indispensable.

The three menu buttons across the top of the main window are described below:

File The File menu is used to bring up the Load... or Print... dialogs.

Load... brings up a dialog which prompts for a directory and filename to load a new

POSTSCRIPT file.

Print... brings up a dialog which prompts for the name of the printer to send the

POSTSCRIPT document to. You can print the whole document or only the current page. You may also write the POSTSCRIPT to a named file.

View The View menu allows you to move to the Next, Previous, First and Last pages of multipage documents.

Edit The edit menu has two choices, POSTSCRIPT and Properties.

PostScript...

brings up a text editor with the POSTSCRIPT document in it and a window which contains all of the errors and other output from the document. You may make changes to the document and press the run button to re-render the page.

Properties...

brings up the property sheet for page size, orientation and resolution.

DPI: This lets you change the "resolution" of the retained bitmap which the page is being rendered onto. 72 dpi will make a US Letter sized page be 612x792 pixels, where 300 dpi would be 2550x3300 pixels. This has the effect of making 72 pageview (1) User Commands OpenWindows Desktop 3.5 dpi images appear smaller and 300 dpi pages appear larger due to the static resolution of the display. pageview starts out at 85 dpi, unless you have the environment variable $DPI set to some other default, or you use the -dpi command line argument.

Size: This lets you change the size of the retained bitmap which the page is rendered onto. USLetter is 8.5x11", Legal is 8.5x14", and the European page sizes are, A3

29.7 x 42.0 cm, A4 21.0 X29.7 cm, A5 14.8 x 21.0 cm, and B517.6 x 25.0 cm.

These values can be set to custom values by the − height and − width command line arguments.

Orientation:

This menu lets you choose which way to rotate the paper in 90 degree increments. This is useful for viewing slides which are commonly rendered in

"Landscape left" orientation.

Timeout: This option allows you to select the job timeout value. This value is used by pageview as the amount of time in which a page of a document must be rendered onto the screen. If the page cannot be rendered in this time, pageview assumes that there is some sort of POSTSCRIPT error on the page which is causing this problem (such as a string or procedure that does not end) and stops trying to display the page. However, often times, documents that contain complex graphics may take a longer than average amount of time to display. In this case, you should increase the job timeout value and attempt to display the page again.

Ignore PostScript Structuring Comments:

pageview is designed to scan a POSTSCRIPT file and determine the different sections of it based on POSTSCRIPT Structuring Comments. For example, from reading these comments, pageview determines where each page of the document starts and ends. However, as there are many POSTSCRIPT documents that do not use the comments, pageview often gets confused as to the number of pages in a document and/or where they began and end. Therefore, if you attempt to view a document, but feel that the resulting displayed document does not look as you expected, you may want to turn on this option. This option will assume that there are no POSTSCRIPT Structuring comments, and interpret the file differently. Be aware though, this method of interpreting the

POSTSCRIPT file may be slower than the default method, especially if the file is very big.

OPTIONS − mono is used to force pageview to use a monochrome retained canvas on color systems.

This saves memory and is faster on some framebuffers.

− w paperwidth sets the width of the "paper" to paperwidth inches, the default is 8.5.

− h paperheight sets the height of the "paper" to paperheight inches, the default is 11.

OpenWindows Desktop 3.5 User Commands pageview (1)

− dpi dots/inch sets the "dpi" of the "paper" to dots/inch. The environment variable $DPI is used if this option is not present, and the default is 85 if this variable is not in the environment. Caution must be used in setting this argument as well as the paper size args above, so you do not exhaust memory resources. For example a USLetter sized page previewed at 300 dpi, takes up 300∗8.5/8 ∗300∗11 or a little over a Megabyte. The same page at 1500 dpi takes over 26 Megabytes.

− mcd colordensity

Sets the maximum color density. The default maximum color density is 100.

However, if an image is to be viewed with a DPI greater than 100, it will not be displayed in color unless the maximum color density is set greater than 100.

− page pagenumber

Sets the page number of the document that is to be displayed when pageview starts.

− dir directory

Sets the current working directory to directory so that you can type filenames at the "Load File: " prompt relative to directory.

− left|right|upsidedown

Sets the rotation of the page.

− timeout job_timeout (sec)

Sets the job timeout value. The default job timeout value is 30 seconds.

− aa Turns on antialiasing.

− low_memory

Runs a low memory version of pageview. This version does not create the offscreen bitmap, and rather renders the document directly onto the viewing canvas. This uses less memory, but performance may suffer especially when the pageview window is hidden and then exposed, as the entire page must be rendered again. If the user attempts to move the page in "relative mode" (pan), the offscreen bitmap is automatically created as this function is not possible without it. Also, this option cannot be used if antialiasing is turned on.

− usage Prints out all valid command line options.

− v Prints out the current version of pageview.

− verbose Prints lots of debugging information (not useful to the user)

If psfile is specified, the POSTSCRIPT code is taken from that file.

If no argument is given, pageview comes up with no document in it and if a ‘− ’is given as the argument, pageview reads the POSTSCRIPT program from standard input.

SEE ALSO lp(1)

OpenWindows user documentation

POSTSCRIPT Language ReferenceManual , Adobe Systems Inc., Addison-Wesley pageview (1) User Commands OpenWindows Desktop 3.5

TRADEMARK POSTSCRIPT is a registered trademark of Adobe Systems Inc