OpenWindows Desktop 3.5 User Commands vkbd (1)

NAME vkbd − virtual keyboard/soft function keys display manager

SYNOPSIS vkbd [ -nopopup ] [ generic-tool-arguments ]

DESCRIPTION vkbd provides functionality to label the function keys specific to the individual application. When the "Function Keys" item is selected from the Workspace Utilities submenu, a panel containing the same number of function keys as your keyboard is displayed at the bottom of the screen. You can also use the keys in the Function Keys panel to activate the functions (assuming you have the Workspace property "Set Input Area" set to "Click

SELECT"): just click SELECT on a key. The labels are automatically updated if you change the input area to another window. If the input area is changed to a window which does not use the function keys, the panel is updated to clear the labels.

vkbd also provides a mechanism to switch between multiple languages by pressing and holding the LANG key. The LANG key is labeled PrSc or Print Screen by default. The

LANG key can be remapped by adding the following to your $HOME/.Xdefaults file:

OpenWindows.KeyboardCommand.Translate: key vkbd is usually started from openwin-sys and is not intended to be used directly.

OPTIONS − nopopup

This option indicates that Function Keys popup panel is not mapped at startup time.

FILES $OPENWINHOME/lib/openwin-sys

SEE ALSO xview (7)

OPENLOOK Graphical User Interface Functional Specification modified 24 March 1992 1