getfrm (1F) FMLI Commands SunOS 5.5

NAME getfrm − returns the current frameID number

SYNOPSIS getfrm

DESCRIPTION getfrm returns the current frameID number. The frameID number is a number assigned to the frame by FMLI and displayed flush left in the frame’s title bar. If a frame is closed its frameID number may be reused when a new frame is opened. getfrm takes no arguments.

EXAMPLES If a menu whose frameID is 3 defines an item to have this action descriptor:

action=open text stdtext `getfrm` the text frame defined in the definition file stdtext would be passed the argument 3 when it is opened.

NOTES It is not a good idea to use getfrm in a backquoted expression coded on a line by itself.

Stand-alone backquoted expressions are evaluated before any descriptors are parsed, thus the frame is not yet fully current, and may not have been assigned a frameID number.

1F-352 modified 5 Jul 1990