SunOS 5.5 User Commands line (1)

NAME line − read one line

SYNOPSIS line

AVAILABILITY SUNWcsu

DESCRIPTION The line utility copies one line (up to and including a new-line) from the standard input and writes it on the standard output. It returns an exit status of 1 on EOF and always prints at least a new-line. It is often used within shell files to read from the user’s terminal.

EXIT STATUS Exit status is:

0 Successful completion

>0 End-of-file on input.

SEE ALSO sh(1), read(2) modified 1 Feb 1995 1-503