SunOS 5.5 FMLI Commands pathconv (1F)

NAME pathconv − search FMLI criteria for filename

SYNOPSIS pathconv [ − f ] [ − v alias ] pathconv [ − t ] [ − l ] [ − nnum ] [ − v string ]

DESCRIPTION The pathconv function converts an alias to its pathname. By default, it takes the alias as a string from the standard input.

OPTIONS − f If − f is specified, the full path will be returned (this is the default).

− t If − t is specified, pathconv will truncate a pathname specified in string in a format suitable for display as a frame title. This format is a shortened version of the full pathname, created by deleting components of the path from the middle of the string until it is under DISPLAYW — 6 characters in length, and then inserting ellipses ( ... ) between the remaining pieces. Ellipses are also used to show truncation at the ends of the strings if necessary, unless the − l option is given.

− l If − l is specified, < and > will be used instead of ellipses ( ... ) to indicate truncation at the ends of the string generated by the − t option. Using − l allows display of the longest possible string while still notifying users it has been truncated.

− nnum If − n is specified, num is the maximum length of the string (in characters) generated by the − t option. The argument num can be any integer from 1 to 255.

− valias | string

If the − v option is used, then alias or string can be specified when pathconv is called. The argument alias must be an alias defined in the alias_file named when fmli was invoked. The argument string can only be used with the − t option and must be a pathname.

EXAMPLES Here is a menu descriptor that uses pathconv to construct the menu title. It searches for

MYPATH in the alias_file named when fmli was invoked:

menu=`pathconv − v MYPATH/ls` . . . where there is a line in alias_file that defines MYPATH. For example,

MYPATH=$HOME /bin:/usr/bin .

Here is a menu descriptor that takes alias from the standard input.

menu=`echo MYPATH/ls | pathconv` . . . SEE ALSO fmli (1) modified 5 Jul 1990 1F-761