SunOS 5.5 FMLI Commands reinit (1F)

NAME reinit − runs an initialization file

SYNOPSIS reinit filename

DESCRIPTION The reinit command is used to change the values of descriptors defined in the initialization file that was named when fmli was invoked and/or define additional descriptors.

FMLI will parse and evaluate the descriptors in filename, and then continue running the current application. The argument filename must be the name of a valid FMLI initialization file.

The reinit command does not re-display the introductory frame or change the layout of screen labels for function keys.

modified 5 Jul 1990 1F-871