reset (1F) FMLI Commands SunOS 5.5

NAME reset − reset the current form field to its default values

SYNOPSIS reset

DESCRIPTION The reset function changes the entry in a field of a form to its default value; that is, the value displayed when the form was opened.

1F-874 modified 5 Jul 1990