SunOS 5.5 FMLI Commands run (1F)

NAME run − run an executable

SYNOPSIS run [g− s] [− e] [− n] [− t string] program

DESCRIPTION The grun function runs program, using the PATH variable to find it. By default, when program has completed, the user is prompted (Press ENTER to continue: ), before being returned to FMLI. The argument program is a system executable followed by its options

(if any).

OPTIONS g− e If g-e is specified the user will be prompted before returning to FMLI only if there is an error condition g− n If g-n is specified the user will never be prompted before returning to FMLI

(useful for programs like gvi , in which the user must do some specific action to exit in the first place).

g− s The g-s option means "silent", implying that the screen will not have to be repainted when program has completed. Note that the g-s option should only be used when program does not write to the terminal. In addition, when g− s is used, program cannot be interrupted, even if it recognizes interrupts.

g− tstring If g− t is specified, string is the name this process will have in the pop-up menu generated by the gfrm-list command. This feature requires the executable gfacesuspend , (See face(1)), to suspend the process and return to the

FMLI application.

EXAMPLE Here is a menu that uses grun :

gmenu="Edit special System files" name="Password file" action=`run − e vi /etc/passwd` name="Group file" action=`run − e vi /etc/group` name="My .profile" action=`run − n vi $HOME/.profile` modified 5 Jul 1990 1F-889