plot (1B) SunOS/BSD Compatibility Package Commands SunOS 5.5

NAME plot, aedplot, atoplot, bgplot, crtplot, dumbplot, gigiplot, hpplot, implot, plottoa, t300, t300s, t4013, t450, tek, vplot, hp7221plot − graphics filters for various plotters

SYNOPSIS /usr/ucb/plot [ − Tterminal ]

AVAILABILITY SUNWscpu

DESCRIPTION plot reads plotting instructions (see plot (4B)) from the standard input and produces plotting instructions suitable for a particular terminal on the standard output.

If no terminal is specified, the environment variable TERM is used. The default terminal is tek .

ENVIRONMENT Except for ver, the following terminal-types can be used with ‘lpr − g’(see lpr ) to produce plotted output:

2648 | 2648a | h8 | hp2648 | hp2648a

Hewlett Packard ® 2648 graphics terminal.

hp7221 | hp7 | h7 |

Hewlett Packard ® 7221 plotter.

300 DASI 300 or GSI terminal (Diablo® mechanism).

300s | 300S DASI 300s terminal (Diablo® mechanism).

450 DASI Hyterm 450 terminal (Diablo® mechanism).

4013 Tektronix ® 4013 storage scope.

4014 | tek Tektronix 4014 and 4015 storage scope with Enhanced Graphics

Module. (Use 4013 for Tektronix ® 4014 or 4015 without the

Enhanced Graphics Module).

aed AED 512 color graphics terminal.

bgplot | bitgraph

BBN bitgraph graphics terminal.

crt Any crt terminal capable of running vi(1).

dumb | un | unknown

Dumb terminals without cursor addressing or line printers.

gigi | vt125 DEC® vt125 terminal.

implot Imagen plotter.

var Benson Varian printer-plotter ver Versatec ® D1200A printer-plotter. The output is scan-converted and suitable input to ‘lpr − v’.

1B-790 modified 3 Aug 1994

SunOS 5.5 SunOS/BSD Compatibility Package Commands plot (1B)

FILES /usr/ucb/aedplot

/usr/ucb/atoplot

/usr/ucb/bgplot

/usr/ucb/crtplot

/usr/ucb/dumbplot

/usr/ucb/gigiplot

/usr/ucb/hp7221plot

/usr/ucb/hpplot

/usr/ucb/implot

/usr/ucb/plot

/usr/ucb/plottoa

/usr/ucb/t300

/usr/ucb/t300s

/usr/ucb/t4013

/usr/ucb/t450

/usr/ucb/tek

/usr/ucb/vplot

SEE ALSO graph (1), tplot (1), vi(1), lpr (1B), plot (4B) modified 3 Aug 1994 1B-791