SunOS 5.5 User Commands uptime (1)

NAME uptime − show how long the system has been up

SYNOPSIS uptime

AVAILABILITY SUNWcsu

DESCRIPTION The uptime command prints the current time, the length of time the system has been up, and the average number of jobs in the run queue over the last 1, 5 and 15 minutes. It is, essentially, the first line of a w(1) command.

EXAMPLE Below is an example of the output uptime provides:

example% uptime

10:47am up 27 day(s), 50 mins, 1 user, load average: 0.18, 0.26, 0.20

SEE ALSO w(1), who(1), whodo (1M)

NOTES who − b gives the time the system was last booted.

modified 18 Mar 1994 1-1125