vsig (1F) FMLI Commands SunOS 5.5

NAME vsig − synchronize a co-process with the controlling FMLI application

SYNOPSIS vsig

AVAILABILITY SUNWesu

DESCRIPTION The vsig executable sends a SIGUSR2 signal to the controlling FMLI process. This signal/alarm causes FMLI to execute the FMLI built-in command checkworld which causes all posted objects with a reread descriptor evaluating to TRUE to be reread. vsig takes no arguments.

EXAMPLES The following is a segment of a shell program:

echo "Sending this string to an FMLI process" vsig

The vsig executable will flush the output buffer beforeit sends the SIGUSR2 signal to make sure the string is actually in the pipe created by the cocreate function.

SEE ALSO coproc(1F), kill (1), kill (2), signal (3C)

NOTES Because vsig synchronize with FMLI, it should be used rather than kill to send a

SIGUSR2 signal to FMLI.

1F-1162 modified 5 Jul 1990