SunOS 5.5 System Calls stime (2)

NAME stime − set system time and date

SYNOPSIS #include <unistd.h> int stime(const time_t ∗tp);

DESCRIPTION stime( ) sets the system’s idea of the time and date. tp points to the value of time as measured in seconds from 00:00:00UTC January 1, 1970.

RETURN VALUES Upon successful completion, a value of 0 is returned. Otherwise, a value of − 1 is returned and errno is set to indicate the error.

ERRORS stime( ) will fail if:

EPERM The effective user of the calling process is not super-user.

SEE ALSO time (2) modified 5 Jul 1990 2-215