SunOS 5.5 System Calls ustat (2)

NAME ustat − get file system statistics

SYNOPSIS #include <sys/types.h>

#include <ustat.h> int ustat(dev_t dev, struct ustat ∗buf);

DESCRIPTION ustat( ) returns information about a mounted file system. devis a device number identifying a device containing a mounted file system (see makedev (3C)). buf is a pointer to a ustat( ) structure that includes the following elements:

daddr_t f_tfree; /∗ Total free blocks ∗/ ino_t f_tinode; /∗ Number of free inodes ∗/ char f_fname[6]; /∗ Filsys name ∗/ char f_fpack[6]; /∗ Filsys pack name ∗/

The last two fields, f_fname and f_fpack may not have significant information on all systems, and in that case, will contain the null character as the first character of these fields.

RETURN VALUES Upon successful completion, a value of 0 is returned. Otherwise, a value of -1 is returned and errno is set to indicate the error.

ERRORS ustat( ) fails if one or more of the following are true:

ECOMM devis on a remote machine and the link to that machine is no longer active.

EFAULT buf points to an illegal address.

EINTR A signal was caught during a ustat( ) function.

EINVAL devis not the device number of a device containing a mounted file system.

ENOLINK devis on a remote machine and the link to that machine is no longer active.

SEE ALSO stat (2), statvfs (2), makedev (3C)

NOTES ustat( ) will be phased out in favor of the statvfs (2) function.

BUGS The NFS revision 2 protocol does not permit the number of free files to be provided to the client; thus, when ustat( ) is done on an NFS file system, f_tinode is always -1.

modified 29 Jul 1991 2-235