SunOS 5.5 System Calls _lwp_info (2)

NAME _lwp_info − return the time-accounting information of a single LWP

SYNOPSIS #include <sys/time.h>

#include <sys/lwp.h> int _lwp_info(struct lwpinfo ∗buffer);

DESCRIPTION _lwp_info( ) fills the lwpinfo structure pointed to by bufferwith time-accounting information pertaining to the calling LWP. This call may be extended in the future to return other information to the lwpinfo structure as needed. The lwpinfo structure in

<sys/lwp.h> includes the following members:

timestruc_t lwp_utime;

timestruc_t lwp_stime;

lwp_utime is the CPU time used while executing instructions in the user space of the calling LWP.

lwp_stime is the CPU time used by the system on behalf of the calling LWP.

RETURN VALUES Upon successful completion, _lwp_info( ) returns 0 and fills in the lwpinfo structure pointed to by buffer.

ERRORS If the following condition is detected, _lwp_info( ) returns the corresponding value:

EFAULT bufferpoints to an illegal address.

SEE ALSO times (2) modified 31 Mar 1994 2-35