atexit (3C ) C Library Functions SunOS 5.5

NAME atexit − add program termination routine

SYNOPSIS #include <stdlib.h> int atexit(void (∗func)(void));

MT-LEVEL Safe

DESCRIPTION atexit( ) adds the function func() to a list of functions to be called without arguments on normal termination of the program. Normal termination occurs by either a call to the exit( ) function or a return from main( ). At most 32 functions may be registered by atexit( ); the functions will be called in the reverse order of their registration.

RETURN VALUES atexit( ) returns 0 if the registration succeeds, nonzero if it fails.

SEE ALSO exit(3C)

3C-156 modified 22 Jan 1993