bgets (3G ) C Library Functions SunOS 5.5

NAME bgets − read stream up to next delimiter

SYNOPSIS cc [ flag ... ] file ... − lgen [ library ... ]

#include <libgen.h> char ∗bgets(char ∗buffer, size_t ∗count, FILE ∗stream, const char ∗breakstring);

MT-LEVEL MT-Safe

DESCRIPTION bgets( ) reads characters from stream into bufferuntil either count is exhausted or one of the characters in breakstring is encountered in the stream. The read data is terminated with a null byte (’\0 ’)and a pointer to the trailing null is returned. If a breakstring character is encountered, the last non-null is the delimiter character that terminated the scan.

Note that, except for the fact that the returned value points to the end of the read string rather than to the beginning, the call bgets(buffer, sizeof buffer, stream, "\n");

is identical to fgets (buffer, sizeof buffer, stream);

There is always enough room reserved in the buffer for the trailing null.

If breakstring is a null pointer, the value of breakstring from the previous call is used. If breakstring is null at the first call, no characters will be used to delimit the string.

RETURN VALUES NULL is returned on error or end-of-file. Reporting the condition is delayed to the next call if any characters were read but not yet returned.

EXAMPLES #include <libgen.h> char buffer[8];

/∗ read in first user name from /etc/passwd ∗/ fp = fopen("/etc/passwd","r");

bgets(buffer, 8, fp, ":");

SEE ALSO gets (3S)

NOTES When compiling multi-thread applications, the _REENTRANT flag must be defined on the compile line. This flag should only be used in multi-thread applications.

3G-166 modified 22 Jan 1993