sqrt (3M ) Mathematical Library SunOS 5.5

NAME sqrt, cbrt − square root, cube root

SYNOPSIS cc [ flag ... ] file ... − lm [ library ... ]

#include <math.h> double sqrt(double x);

double cbrt(double x);

MT-LEVEL MT-Safe

DESCRIPTION sqrt( x) returns the square root of x, correctly rounded according to ANSI/IEEE 754-1985.

cbrt( x) returns the cube root of x. cbrt( ) is accurate to within 0.7 ulps.

RETURN VALUES For exceptional cases, matherr (3M) tabulates the values to be returned as dictated by various Standards.

SEE ALSO matherr (3M)

3M-1048 modified 4 Mar 1994