curs_beep (3X) Miscellaneous Library Functions SunOS 5.5

NAME curs_beep, beep, flash − curses bell and screen flash routines

SYNOPSIS cc [ flag ... ] file ... − lcurses [ library .. ]

#include <curses.h> int beep(void);

int flash(void);

MT-LEVEL Unsafe

DESCRIPTION The beep( ) and flash( ) routines are used to signal the terminal user. The routine beep( ) sounds the audible alarm on the terminal, if possible; if that is not possible, it flashes the screen (visible bell), if that is possible. The routine flash( ) flashes the screen, and if that is not possible, sounds the audible signal. If neither signal is possible, nothing happens.

Nearly all terminals have an audible signal (bell or beep), but only some can flash the screen.

RETURN VALUES These routines always return OK.

SEE ALSO curses (3X)

NOTES The header <curses.h> automatically includes the headers <stdio.h> and <unctrl.h> .

3X-222 modified 22 Jan 1993