SunOS 5.5 Standard I/O Functions cuserid (3S)

NAME cuserid − get character login name of the user

SYNOPSIS #include <stdio.h> char ∗cuserid(char ∗s);

MT-LEVEL MT-Safe

DESCRIPTION cuserid( ) generates a character-string representation of the login name that the owner of the current process is logged in under. If s is a NULL pointer, this representation is generated in an internal static area, the address of which is returned. Otherwise, s is assumed to point to an array of at least L_cuserid characters; the representation is left in this array. The constant L_cuserid is defined in the <stdio.h> header.

RETURN VALUES If the login name cannot be found, cuserid( ) returns a NULL pointer; if s is not a NULL pointer, a null character `\0´ will be placed at s[0].

SEE ALSO getlogin (3C), getpwnam (3C)

NOTES In multi-thread applications, the caller must always supply an array s for the return value.

modified 22 Jan 1993 3S-297