dlerror (3X) Miscellaneous Library Functions SunOS 5.5

NAME dlerror − get diagnostic information

SYNOPSIS cc [ flag ... ] file ... − ldl [ library ... ]

#include <dlfcn.h> char ∗dlerror(void);

MT-LEVEL MT-Safe

DESCRIPTION dlerror( ) is one of a family of routines that give the user direct access to the dynamic linking facilities. (SEE Linkerand Libraries Guide ). These routines are made available via the library loaded when the option -ldl is passed to the link-editor.

These routines are available to dynamically linked processes ONLY.

dlerror( ) returns a null-terminated character string (with no trailing newline) that describes the last error that occurred during dynamic linking processing. If no dynamic linking errors have occurred since the last invocation of dlerror( ), dlerror( ) returns

NULL. Thus, invoking dlerror( ) a second time, immediately following a prior invocation, will result in NULL being returned.

SEE ALSO ld(1), dladdr (3X),dlclose (3X),dlopen (3X),dlsym (3X)

Linkerand Libraries Guide

NOTES The messages returned by dlerror( ) may reside in a static buffer that is overwritten on each call to dlerror( ). Application code should not write to this buffer. Programs wishing to preserve an error message should make their own copies of that message.

3X-314 modified 22 Jan 1993