SunOS 5.5 Miscellaneous Library Functions form_data (3X)

NAME form_data, data_ahead, data_behind − tell if forms field has off-screen data ahead or behind

SYNOPSIS cc [ flag ... ] file ... − lform -lcurses [ library .. ]

#include <form.h> int data_ahead( FORM ∗form);

int data_behind( FORM ∗form);

MT-LEVEL Unsafe

DESCRIPTION data_ahead( ) returns TRUE (1) if the current field has more off-screen data ahead; otherwise it returns FALSE (0).

data_behind( ) returns TRUE (1) if the current field has more off-screen data behind; otherwise it returns FALSE (0).

SEE ALSO curses (3X),forms (3X)

NOTES The header <form.h> automatically includes the headers <eti.h> and <curses.h> .

modified 22 Jan 1993 3X-429