isastream (3C ) C Library Functions SunOS 5.5

NAME isastream − test a file descriptor

SYNOPSIS #include <stropts.h> int isastream(int fildes);

MT-LEVEL MT-Safe

DESCRIPTION The function isastream( ) determines if a file descriptor represents a STREAMS file. fildes refers to an open file descriptor.

RETURN VALUES If successful, isastream( ) returns 1 if fildes represents a STREAMS file, and 0 if not. On failure, isastream( ) returns − 1 with errno set to indicate an error.

ERRORS Under the following conditions, isastream( ) fails and sets errno to:

EBADF fildes is not a valid file descriptor.

SEE ALSO streamio (7I)

STREAMSProgramming Guide

3C-592 modified 17 Jan 1994