nis_server (3N ) Network Functions SunOS 5.5

NAME nis_server, nis_mkdir, nis_rmdir, nis_servstate, nis_stats, nis_getservlist, nis_freeservlist, nis_freetags − miscellaneous NIS+ functions

SYNOPSIS cc [ flag ... ] file... − lnsl [ library. .. ]

#include <rpcsvc/nis.h> nis_error nis_mkdir(const nis_name dirname, const nis_server ∗machine);

nis_error nis_rmdir(const nis_name dirname, const nis_server ∗machine);

nis_error nis_servstate(const nis_server ∗machine,const nis_tag ∗tags, const int numtags , nis_tag ∗∗result);

nis_error nis_stats(const nis_server ∗machine, const nis_tag ∗tags, const int numtags, nis_tag ∗∗result);

void nis_freetags(nis_tag ∗tags, const int numtags );

nis_server ∗∗nis_getservlist(const nis_name dirname);

void nis_freeservlist(nis_server ∗∗machines);

MT-LEVEL MT-Safe

DESCRIPTION These functions provide a variety of services for NIS+ applications.

nis_mkdir( ) is used to create the necessary databases to support NIS+ service for a directory, dirname, on a server, machine. If this operation is successful, it means that the directory object describing dirname has been updated to reflect that server machineis serving the named directory. For a description of the nis_server structure, refer to nis_objects (3N).

nis_rmdir( ) is used to delete the directory, dirname, from the specified machine. The machineparameter cannot be NULL. For a description of the nis_server structure, refer to nis_objects (3N).

nis_servstate( ) is used to set and read the various state variables of the NIS+ servers. In particular the internal debugging state of the servers may be set and queried.

The nis_stats( ) function is used to retrieve statistics about how the server is operating.

Tracking these statistics can help administrators determine when they need to add additional replicas or to break up a domain into two or more subdomains. For more information on reading statistics, see nisstat (1M).

nis_servstate( ) and nis_stats( ) use the tag list. This tag list is a variable length array of nis_tag structures whose length is passed to the function in the numtags parameter. The set of legal tags are defined in the file <rpcsvc/nis_tags.h> which is included in

<rpcsvc/nis.h> . Because these tags can and do vary between implementations of the

NIS+ service, it is best to consult this file for the supported list. Passing unrecognized tags to a server will result in their tag_value member being set to the string ‘‘unknown.’’ Both of these functions return their results in malloced tag structure, ∗result. If there is an error, ∗result is set to NULL. The tag_value pointers points to allocated string memory which contains the results. Use nis_freetags( ) to free the tag structure.

3N-778 modified 15 Jul 1993

SunOS 5.5 Network Functions nis_server (3N ) nis_getservlist( ) returns a null terminated list of nis_server structures that represent the list of servers that serve the domain named dirname. Servers from this list can be used when calling functions that require the name of a NIS+ server. For a description of the nis_server structure, refer to nis_objects (3N). nis_freeservlist( ) frees the list of servers returned by nis_getservlist( ). Note that this is the only legal way to free that list.

SEE ALSO nisstat (1M), nis_names (3N), nis_objects (3N), nis_subr (3N) modified 15 Jul 1993 3N-779