SunOS 5.5 Miscellaneous Library Functions panel_update (3X)

NAME panel_update, update_panels − panels virtual screen refresh routine

SYNOPSIS cc [ flag ... ] file ... − lpanel -lcurses [ library .. ]

#include <panel.h> void update_panels(void);

MT-LEVEL Unsafe

DESCRIPTION update_panels( ) refreshes the virtual screen to reflect the depth relationships between the panels in the deck. The user must use the curses library call doupdate( ) (see curs_refresh (3X)) to refresh the physical screen.

SEE ALSO curs_refresh (3X),curses (3X),panels (3X)

NOTES The header <panel.h> automatically includes the header <curses.h> .

modified 22 Jan 1993 3X-805