ptsname (3C ) C Library Functions SunOS 5.5

NAME ptsname − get name of the slave pseudo-terminal device

SYNOPSIS #include <stdio.h> char ∗ptsname(int fildes);

MT-LEVEL Safe

DESCRIPTION The ptsname( ) function returns the name of the slave pseudo-terminal device associated with a master pseudo-terminal device. fildes is a file descriptor returned from a successful open of the master device. ptsname( ) returns a pointer to a string containing the null-terminated path name of the slave device of the form /dev/pts/N , where N is a nonnegative integer.

RETURN VALUES Upon successful completion, the function ptsname( ) returns a pointer to a string which is the name of the pseudo-terminal slave device. This value points to a static data area that is overwritten by each call to ptsname( ). Upon failure, ptsname( ) returns NULL. This could occur if fildes is an invalid file descriptor or if the slave device name does not exist in the file system.

SEE ALSO open (2), grantpt (3C), ttyname (3C), unlockpt (3C)

STREAMSProgramming Guide

3C-876 modified 22 Jan 1993