SunOS 5.5 C Library Functions raise (3C )

NAME raise − send signal to program

SYNOPSIS #include <signal.h> int raise(int sig);

MT-LEVEL MT-Safe

DESCRIPTION raise( ) sends the signal sig to the executing program.

raise( ) uses kill( ) to send the signal to the executing program:

kill(getpid( ), sig);

See kill (2) for a detailed list of failure conditions. See signal (3C) for a list of signals.

RETURN VALUES raise( ) returns zero if the operation succeeds. Otherwise, raise( ) returns − 1 and errno is set to indicate the error.

SEE ALSO getpid (2), kill (2), signal (3C) modified 22 Jan 1993 3C-887