SunOS 5.5 Miscellaneous Library Functions panel_window (3X)

NAME panel_window, replace_panel − get or set the current window of a panels panel

SYNOPSIS cc [ flag ... ] file ... − lpanel -lcurses [ library .. ]

#include <panel.h>

WINDOW ∗panel_window( PANEL ∗panel);

int replace_panel( PANEL ∗panel, WINDOW ∗win);

MT-LEVEL Unsafe

DESCRIPTION panel_window( ) returns a pointer to the window of panel.

replace_panel( ) replaces the current window of panel with win.

RETURN VALUES panel_window( ) returns NULL on failure.

replace_panel( ) returns OK on successful completion, ERR otherwise.

SEE ALSO curses (3X),panels (3X)

NOTES The header <panel.h> automatically includes the header <curses.h> .

modified 22 Jan 1993 3X-807