shutdown (3N ) Network Functions SunOS 5.5

NAME shutdown − shut down part of a full-duplex connection

SYNOPSIS cc [ flag ... ] file ... − lsocket − lnsl [ library ... ] int shutdown(int s, int how);

MT-LEVEL Safe

DESCRIPTION The shutdown( ) call shuts down all or part of a full-duplex connection on the socket associated with s. If how is 0, then further receives will be disallowed. If how is 1, then further sends will be disallowed. If how is 2, then further sends and receives will be disallowed.

RETURN VALUES A 0 is returned if the call succeeds, − 1 if it fails.

ERRORS The call succeeds unless:

EBADF s is not a valid file descriptor.

ENOMEM There was insufficient user memory available for the operation to complete.

ENOSR There were insufficient STREAMS resources available for the operation to complete.

ENOTCONN The specified socket is not connected.

ENOTSOCK s is not a socket.

SEE ALSO connect (3N), socket (3N)

NOTES The how values should be defined constants.

3N-1020 modified 30 Mar 1993