strsignal (3C ) C Library Functions SunOS 5.5

NAME strsignal − get error message string

SYNOPSIS #include <string.h> char ∗strsignal(int sig);

MT-LEVEL Safe

DESCRIPTION strsignal( ) maps the signal number in sig to a string describing the signal, and returns a pointer to that string. strsignal( ) uses the same set of the messages as psignal (3C). The returned string should not be overwritten.

RETURN VALUES strsignal( ) returns NULL if sig is not a valid signal number.

SEE ALSO gettext (3I), psignal (3C), setlocale (3C), str2sig (3C)

NOTES If the application is linked with − lintl , then messages returned from this function are in the native language specified by the LC_MESSAGES locale category; see setlocale (3C).

3C-1076 modified 3 Mar 1994