SunOS 5.5 C Library Functions swab (3C )

NAME swab − swap bytes

SYNOPSIS #include <stdlib.h> void swab(const char ∗from, char ∗to, int nbytes);

MT-LEVEL MT-Safe

DESCRIPTION swab( ) copies nbytes bytes pointed to by from to the array pointed to by to, exchanging adjacent even and odd bytes. nbytes should be even and non-negative. If nbytes is odd and positive, swab( ) uses nbytes− 1 instead. If nbytes is negative, swab( ) does nothing.

modified 22 Jan 1993 3C-1081