tcsetpgrp (3C ) C Library Functions SunOS 5.5

NAME tcsetpgrp − set foreground process group id of terminal

SYNOPSIS #include <unistd.h> int tcsetpgrp(int fildes, pid_t pgid);

MT-LEVEL MT-Safe

DESCRIPTION tcsetpgrp( ) sets the foreground process group ID of the terminal specified by fildes to pgid. The file associated with fildes must be the controlling terminal of the calling process and the controlling terminal must be currently associated with the session of the calling process. The value of pgid must match a process group ID of a process in the same session as the calling process.

RETURN VALUES Upon successful completion, tcsetpgrp( ) returns a value of 0. Otherwise, a value of − 1 is returned and errno is set to indicate the error.

ERRORS tcsetpgrp( ) fails if one or more of the following is true:

EBADF The fildes argument is not a valid file descriptor.

EINVAL The fildes argument is a terminal that does not support tcsetpgrp( ), or pgid is not a valid process group ID.

ENOTTY The calling process does not have a controlling terminal, or the file is not the controlling terminal, or the controlling terminal is no longer associated with the session of the calling process.

EPERM pgid does not match the process group ID of an existing process in the same session as the calling process.

SEE ALSO termio(7I)

3C-1136 modified 22 Jan 1993