SunOS 5.5 SunOS/BSD Compatibility Library Functions times (3B)

NAME times − get process times

SYNOPSIS /usr/ucb/cc [ flag ... ] file ...

#include <sys/param.h>

#include <sys/types.h>

#include <sys/times.h> int times( tmsp) register struct tms ∗tmsp;

DESCRIPTION times( ) returns time-accounting information for the current process and for the terminated child processes of the current process. All times are reported in clock ticks. The number of clock ticks per second is defined by the variable CLK_TCK , found in the header <limits.h> .

A structure with the following members is returned by times( ):

time_t tms_utime; /∗ user time ∗/ time_t tms_stime; /∗ system time ∗/ time_t tms_cutime; /∗ user time, children ∗/ time_t tms_cstime; /∗ system time, children ∗/

The children’s times are the sum of the children’s process times and their children’s times.

RETURN VALUES times( ) returns

0 on success.

− 1 on failure.

SEE ALSO time (1), time (2), wait (2), getrusage (3C)

NOTES Use of these interfaces should be restricted to only applications written on BSD platforms. Use of these interfaces with any of the system libraries or in multi-thread applications is unsupported.

times( ) has been superseded by getrusage (3C).

modified 18 Apr 1994 3B-1159