SunOS 5.5 C Library Functions unlockpt (3C )

NAME unlockpt − unlock a pseudo-terminal master/slave pair

SYNOPSIS int unlockpt(int fildes);

MT-LEVEL Safe

DESCRIPTION The function unlockpt( ) clears a lock flag associated with the slave pseudo-terminal device associated with its master pseudo-terminal counterpart so that the slave pseudoterminal device can be opened. fildes is a file descriptor returned from a successful open of a master pseudo-terminal device.

RETURN VALUES Upon successful completion, the function unlockpt( ) returns 0; otherwise it returns -1. A failure may occur if fildes is not an open file descriptor or is not associated with a master pseudo-terminal device.

SEE ALSO open (2), grantpt (3C), ptsname (3C)

STREAMSProgramming Guide modified 22 Jan 1993 3C-1175