SunOS 5.5 Miscellaneous Library Functions form_post (3X)

NAME form_post, post_form, unpost_form − write or erase forms from associated subwindows

SYNOPSIS cc [ flag ... ] file ... − lform -lcurses [ library .. ]

#include <form.h> int post_form(FORM ∗form);

int unpost_form( FORM ∗form);

MT-LEVEL Unsafe

DESCRIPTION post_form( ) writes forminto its associated subwindow. The application programmer must use curses library routines to display the form on the physical screen or call update_panels( ) if the panels library is being used.

unpost_form( ) erases formfrom its associated subwindow.

RETURN VALUES These routines return one of the following:

E_OK − The function returned successfully.

E_SYSTEM_ERROR − System error.

E_BAD_ARGUMENT − An argument is incorrect.

E_POSTED − The form is posted.

E_NOT_POSTED − The form is not posted.

E_NO_ROOM − The form does not fit in the subwindow.

E_BAD_STATE − The routine was called from an initialization or termination function.

E_NOT_CONNECTED − The field is not connected to a form.

SEE ALSO curses (3X),forms (3X),panel_update (3X),panels (3X)

NOTES The header <form.h> automatically includes the headers <eti.h> and <curses.h> .

modified 22 Jan 1993 3X-451