SunOS 5.5 C Library Functions vsyslog (3)

NAME vsyslog − log message with a varargs argument list

SYNOPSIS #include <syslog.h>

#include <varargs.h> int vsyslog(int priority, const char ∗message, va_list ap);

MT-LEVEL Safe

DESCRIPTION vsyslog( ) is the same as syslog (3) except that instead of being called with a variable number of arguments, it is called with an argument list as defined by varargs (5).

EXAMPLES The following demonstrates how vsyslog( ) could be used to write an error routine.

#include <syslog.h>

#include <varargs.h> ... /∗ ∗ error should be called like:

∗ error(pri, function_name, format, arg1, arg2. ..);

∗ Note that pri, function_name, and format cannot be declared

∗ separately because of the definition of varargs. ∗/ /∗VARARGS0∗/ void error(va_alist) va_dcl; { va_list args;

int pri;

char ∗message;

va_start(args);

pri = va_arg(args, int);

/∗ log name of function causing error ∗/

(void) syslog(pri, "ERROR in %s", va_arg(args, char ∗));

message = va_arg(args, char ∗);

/∗ log remainder of message ∗/

(void) vsyslog(pri, msg, args);

va_end(args);

(void) abort( ); } SEE ALSO syslog (3), varargs (5) modified 22 Jan 1993 3-1189